Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

EzVPN und FlexVPN

EzVPN-Modell - Was steht da?

Tunnelaushandlung

FlexVPN Remote Access VPN-Modell

FlexVPN-Server

Authentifizierungsmethoden des IOS FlexVPN-Clients

Tunnelaushandlung

Ersteinrichtung

Topologie

Erstkonfiguration

Migration von EzVPN zu FlexVPN

Migrierte Topologie

Konfiguration

Überprüfung des FlexVPN-Betriebs

FlexVPN-Server

FlexVPN Remote

Zugehörige Informationen

Einführung

Dieses Dokument bietet Unterstützung bei der Migration von der EzVPN-Konfiguration (Internet Key Exchange v1 (IKEv1) zur FlexVPN-Konfiguration (IKEv2) mit möglichst wenigen Problemen. Da sich IKEv2 Remote Access in gewisser Weise von IKEv1 Remote Access unterscheidet, was die Migration etwas kompliziert macht, hilft Ihnen dieses Dokument bei der Auswahl verschiedener Design-Ansätze bei der Migration vom EzVPN-Modell zum FlexVPN Remote Access-Modell.

Dieses Dokument behandelt den IOS FlexVPN-Client oder den Hardware-Client. Der Software-Client wird in diesem Dokument nicht behandelt. Weitere Informationen zum Software-Client finden Sie unter:

- FlexVPN: IKEv2 mit integriertem Windows-Client und Zertifikatauthentifizierung

- Konfigurationsbeispiel für FlexVPN- und AnyConnect IKEv2-Client

- FlexVPN-Bereitstellung: AnyConnect IKEv2 Remote Access mit EAP-MD5

Voraussetzungen

Anforderungen

Cisco empfiehlt, über Kenntnisse in folgenden Bereichen zu verfügen:

- IKEv2

- Cisco FlexVPN

- Cisco AnyConnect Secure Mobility Client

- Cisco VPN-Client

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

EzVPN und FlexVPN

EzVPN-Modell - Was steht da?

Wie der Name schon sagt, besteht das Ziel von EzVPN darin, die VPN-Konfiguration auf den Remote-Clients zu vereinfachen. Um dies zu erreichen, wird der Client mit minimalen Details konfiguriert, die erforderlich sind, um den richtigen EzVPN-Server zu kontaktieren, der auch als Client-Profil bezeichnet wird.

Tunnelaushandlung

FlexVPN Remote Access VPN-Modell

FlexVPN-Server

Ein wichtiger Unterschied zwischen normalen FlexVPN- und FlexVPN Remote Access-Konfigurationen besteht darin, dass sich der Server nur mithilfe der vorinstallierten Schlüssel und Zertifikate (RSA-SIG) bei den FlexVPN-Clients authentifizieren muss. Mit FlexVPN können Sie unabhängig voneinander entscheiden, welche Authentifizierungsmethoden der Initiator und der Responder verwendet. Mit anderen Worten, sie können gleich sein oder anders sein. Beim FlexVPN Remote Access hat der Server jedoch keine Wahl.

Authentifizierungsmethoden des IOS FlexVPN-Clients

Der Client unterstützt die folgenden Authentifizierungsmethoden:

- RSA-SIG - Digitale Zertifikatauthentifizierung.

- Pre-Share - PSK-Authentifizierung (Pre-Shared Key).

- Extensible Authentication Protocol (EAP) - EAP-Authentifizierung EAP-Unterstützung für IOS FlexVPN-Client wurde in 15.2(3)T hinzugefügt.

Die vom IOS FlexVPN-Client unterstützten EAP-Methoden umfassen:

- Extensible Authentication Protocol-Message Digest 5 (EAP-MD5),

- Extensible Authentication Protocol - Microsoft Challenge Handshake Authentication Protocol Version 2 (EAP-MSCHAPv2) und

- Extensible Authentication Protocol - Generic Token Card (EAP-GTC).

In diesem Dokument wird nur die Verwendung der RSA-SIG-Authentifizierung aus folgenden Gründen beschrieben:

- Skalierbar - Jeder Client erhält ein Zertifikat, und auf dem Server wird ein generischer Teil der Client-Identität damit authentifiziert.

- Sicher - Sicherer als ein Platzhalter-PSK (bei lokaler Autorisierung). Obwohl es bei der AAA-Autorisierung (Authentifizierung, Autorisierung und Abrechnung) einfacher ist, separate PSKs auf der Grundlage einer verwalteten IKE-Identität zu schreiben.

Die in diesem Dokument gezeigte FlexVPN-Client-Konfiguration scheint im Vergleich zum EasyVPN-Client kaum vollständig zu sein. Dies liegt daran, dass die Konfiguration einige Teile der Konfiguration umfasst, die aufgrund intelligenter Standardwerte nicht vom Benutzer konfiguriert werden müssen. Unter "Smart Default" (Intelligente Standardwerte) wird der Begriff zur Bezugnahme auf die vorkonfigurierte oder Standardkonfiguration für verschiedene Aspekte wie das Angebot, die Richtlinie, das IPSec-Transformationssatz usw. verstanden. Im Gegensatz zu IKEv1-Standardwerten sind die Smart Default-Werte für IKEv2 stark. Beispielsweise werden in den Vorschlägen Advanced Encryption Standard (AES-256), Secure Hash Algorithm (SHA-512) und Group-5 verwendet usw.

Tunnelaushandlung

Weitere Informationen zum Austausch von Paketen für einen IKEv2-Austausch finden Sie unter Debuggen auf IKEv2-Paketaustausch und Protokollebene.

Ersteinrichtung

Topologie

Erstkonfiguration

EzVPN-Hub - dVTI-basiert

!! AAA Config for EzVPN clients. We are using Local AAA Server.

aaa new-model

aaa authentication login default local

aaa authorization network default local

!! ISAKMP Policy

crypto isakmp policy 1

encr 3des

authentication pre-share

group 2

!! ISAKMP On-Demand Keep-Alive

crypto isakmp keepalive 10 2

!! EzVPN Split ACL

access-list 101 permit ip 10.10.0.0 0.0.0.255 any

!! EzVPN Client Group Configuration. This is what holds all the config attributes

crypto isakmp client configuration group cisco

key cisco

dns 6.0.0.2

wins 7.0.0.1

domain cisco.com

acl 101

save-password

!! ISAKMP Profile. This ties Client IKE identity to AAA.

!! And since this is dVTI setup, ISAKMP Profile tells the IOS

!!   from which Virtual-Template (VT1) to clone the Virtual Access interfaces

crypto isakmp profile vi

match identity group cisco

client authentication list default

isakmp authorization list default

virtual-template 1

!! IPSec Transform Set.

crypto ipsec transform-set set esp-3des esp-sha-hmac

!! IPSec Profile. This ties Transform set and ISAKMP Profile together.

crypto ipsec profile vi

set transform-set set

set isakmp-profile vi

!! The loopback interface. And virtual-template borrows the address from here.

interface Loopback0

ip address 10.10.10.1 255.255.255.252

!! dVTI interface.

interface Virtual-Template1 type tunnel

ip unnumbered Loopback0

tunnel mode ipsec ipv4

tunnel protection ipsec profile vi

EzVPN-Client - Classic (ohne VTI)

!! ISAKMP On-Demand Keep-Alive

crypto isakmp keepalive 10 2

!! EzVPN Client - Group Name and The key (as configured on the Server),

!!   Peer address and XAUTH config go here.

crypto ipsec client ezvpn ez

connect auto

group cisco key cisco

local-address Ethernet0/0

mode network-extension

peer 10.0.0.1

username cisco password cisco

xauth userid mode local

!! EzVPn outside interface - i.e. WAN interface

interface Ethernet0/0

ip address 10.1.1.2 255.255.255.0

crypto ipsec client ezvpn ez

!! EzVPN inside interface

!! Traffic sourced from this LAN is sent over established Tunnel

interface Ethernet0/1

ip address 10.10.1.1 255.255.255.0

crypto ipsec client ezvpn ez inside

EzVPN-Client - Erweitert (VTI-basiert)

!! VTI -

interface Virtual-Template1 type tunnel

no ip address

tunnel mode ipsec ipv4

!! ISAKMP On-Demand Keep-Alive

crypto isakmp keepalive 10 2

!! EzVPN Client - Group Name and The key (as configured on the Server),

!!   Peer address and XAUTH config go here.

!! Also this config says which Virtual Template to use.

crypto ipsec client ezvpn ez

connect auto

group cisco key cisco

local-address Ethernet0/0

mode network-extension

peer 10.0.0.1

virtual-interface 1

username cisco password cisco

xauth userid mode local

!! EzVPn outside interface - WAN interface

interface Ethernet0/0

ip address 10.1.1.3 255.255.255.0

crypto ipsec client ezvpn ez

!! EzVPN inside interface -

!! Traffic sourced from this LAN is sent over established Tunnel

interface Ethernet0/1

ip address 10.10.2.1 255.255.255.0

crypto ipsec client ezvpn ez inside

Migration von EzVPN zu FlexVPN

Der Server, der als EzVPN-Server fungiert, kann auch als FlexVPN-Server fungieren, sofern er die IKEv2-Remote-Zugriffskonfiguration unterstützt. Für eine vollständige Unterstützung der IKEv2-Konfiguration wird alles über IOS v15.2(3)T hinausgehende empfohlen. In diesen Beispielen wurde 15.2(4)M1 verwendet.

Es gibt zwei mögliche Ansätze:

1. Einrichtung des EzVPN-Servers als FlexVPN-Server und Migration der EzVPN-Clients zur Flex-Konfiguration

2. Einrichten eines anderen Routers als FlexVPN-Server. EzVPN-Clients und migrierte FlexVPN-Clients kommunizieren weiterhin durch die Herstellung einer Verbindung zwischen dem FlexVPN-Server und dem EzVPN-Server.

Dieses Dokument beschreibt den zweiten Ansatz und verwendet einen neuen Spoke-Ansatz (z. B. Spoke3) als FlexVPN-Client. Dieser Spoke kann als Referenz für die zukünftige Migration anderer Clients verwendet werden.

Migrationsschritte

Beachten Sie, dass Sie bei der Migration von einem EzVPN-Spoke zu einem FlexVPN-Spoke die FlexVPN-Konfiguration in das EzVPN-Spoke laden können. Während des Umstiegs ist jedoch möglicherweise ein Out-of-Band-Verwaltungszugriff (kein VPN) erforderlich.

Migrierte Topologie

Konfiguration

FlexVPN-Hub

!! AAA Authorization done Locally

aaa new-model

aaa authorization network Flex local

!! PKI TrustPoint to Sign and Validate Certificates.

!! Contains Identity Certificate and CA Certificate

crypto pki trustpoint FlexServer

enrollment terminal

revocation-check none

rsakeypair FlexServer

subject-name CN=flexserver.cisco.com,OU=FlexVPN

!! Access-list used in Config-Reply in order to push routes

access-list 1 permit 10.10.0.0 0.0.0.255

!! IKEv2 Authorization done locally. Used in Config-Set.

crypto ikev2 authorization policy FlexClient-Author

def-domain cisco.com

route set interface

route set access-list 1

!! IKEv2 Proposal. Optional Config. Smart-Default takes care of this.

crypto ikev2 proposal FlexClient-Proposal

encryption aes-cbc-128 aes-cbc-192 3des

integrity sha256 sha512 sha1

group 5 2

!! If IKEv2 Proposal was left out default, then IKEv2 Policy can be left out too.

!! Ties Proposal to Peer address/fvrf

crypto ikev2 policy FlexClient-Policy

match fvrf any

proposal FlexClient-Proposal

!! IKEv2 Profile. This is the main Part

!! Clients are configured to send their FQDN. And we match the domain 'cisco.com'

!! We are sending 'flexserver.cisco.com' as the fqdn identity.

!! Local and Remote authentication is RSA-SIG

!! Authorization (config-reply) is done locally with the user-name

!!   'FlexClient-Author'

!! This whole profile is tied to Virtual-Template 1

crypto ikev2 profile FlexClient-Profile

match identity remote fqdn domain cisco.com

identity local fqdn flexserver.cisco.com

authentication remote rsa-sig

authentication local rsa-sig

pki trustpoint FlexServer

aaa authorization group cert list Flex FlexClient-Author

virtual-template 1

!! IPSec Transform set. Optional Config, since Smart Default takes care of this.

crypto ipsec transform-set ESP-AES-SHA1 esp-aes esp-sha-hmac

!! IPSec Profile ties default/Configured transform set with the IKEv2 Profile

crypto ipsec profile FlexClient-IPSec

set transform-set ESP-AES-SHA1

set ikev2-profile FlexClient-Profile

!! Loopback interface lends ip address to Virtual-template and

!!   eventually to Virtual-Access interfaces spawned.

interface Loopback0

ip address 10.10.10.1 255.255.255.252

!! The IKEv2 enabled Virtual-Template

interface Virtual-Template1 type tunnel

ip unnumbered Loopback0

tunnel protection ipsec profile FlexClient-IPSec

!! WAN interface

interface Ethernet0/0

ip address 10.0.0.2 255.255.255.0

!! LAN interfaces

interface Ethernet0/1

ip address 10.10.0.1 255.255.255.0

Hinweis zu Serverzertifikaten

Key Usage (KU) definiert den Zweck oder die beabsichtigte Verwendung des öffentlichen Schlüssels. Enhanced/Extended Key Usage (EKU) verfeinert die Schlüsselverwendung. FlexVPN erfordert, dass das Serverzertifikat über ein EKU der Serverauth (OID = 1.3.6.1.5.7.3.1) mit den KU-Attributen Digital Signature und Key Encipherment verfügt, damit das Zertifikat vom Kunden akzeptiert werden kann.

FlexServer#show crypto pki certificates verbose

Certificate

Status: Available

Version: 3

Certificate Serial Number (hex): 09

Certificate Usage: General Purpose

Issuer:

l=lal-bagh

c=IN

o=Cisco

ou=TAC

cn=Praveen

Subject:

Name: flexserver.cisco.com

ou=FlexVPN

cn=flexserver.cisco.com

CRL Distribution Points:

http://10.48.67.33:80/Praveen/Praveen.crl

<snip>

Signature Algorithm: MD5 with RSA Encryption

Fingerprint MD5: F3646C9B 1CC26A81 C3CB2034 061302AA

Fingerprint SHA1: 7E9E99D4 B66C70E3 CBA8C4DB DD94629C 023EEBE7

X509v3 extensions:

X509v3 Key Usage: E0000000

Digital Signature

Non Repudiation

Key Encipherment

<snip>

Authority Info Access:

Extended Key Usage:

Client Auth

Server Auth

Associated Trustpoints: FlexServer

Storage: nvram:lal-bagh#9.cer

Key Label: FlexServer

Key storage device: private config

CA Certificate

<snip>

Konfiguration des FlexVPN-Clients

!! AAA Authorization done Locally

aaa new-model

aaa authorization network Flex local

!! PKI TrustPoint to Sign and Validate Certificates.

!! Contains Identity Certificate and CA Certificate

crypto pki trustpoint Spoke3-Flex

enrollment terminal

revocation-check none

subject-name CN=spoke3.cisco.com,OU=FlexVPN

rsakeypair Spoke3-Flex

!! Access-list used in Config-Set in order to push routes

access-list 1 permit 10.10.3.0 0.0.0.255

!! IKEv2 Authorization done locally. Used in Config-Set.

crypto ikev2 authorization policy FlexClient-Author

route set interface

route set access-list 1

!! IKEv2 Proposal. Optional Config. Smart-Default takes care of this.

crypto ikev2 proposal FlexClient-Proposal

encryption aes-cbc-128 aes-cbc-192 3des

integrity sha256 sha512 sha1

group 5 2

!! If IKEv2 Proposal was left out default, then IKEv2 Policy can be left out too.

!! Ties Proposal to Peer address/fvrf

crypto ikev2 policy FlexClient-Policy

match fvrf any

proposal FlexClient-Proposal

!! IKEv2 Profile. This is the main Part

!! Server is configured to send its FQDN type IKE-ID,

!!    and we match the domain 'cisco.com'

!! (If the IKE-ID type is DN (extracted from the certificate),

!!    we will need a certificate map)

!! We are sending 'spoke3.cisco.com' as the IKE-identity of type fqdn.

!! Local and Remote authentication is RSA-SIG

!! Authorization (config-set) is done locally using the user-name filter

!!    'FlexClient-Author'

crypto ikev2 profile FlexClient-Profile

match identity remote fqdn flexserver.cisco.com

identity local fqdn spoke3.cisco.com

authentication remote rsa-sig

authentication local rsa-sig

pki trustpoint Spoke3-Flex

aaa authorization group cert list Flex FlexClient-Author

!! IPSec Transform set. Optional Config, since Smart Default takes care of this.

crypto ipsec transform-set ESP-AES-SHA1 esp-aes esp-sha-hmac

!! IPSec Profile ties the transform set with the IKEv2 Profile

crypto ipsec profile FlexClient-IPSec

set transform-set ESP-AES-SHA1

set ikev2-profile FlexClient-Profile

!! FlexVPN Client Tunnel interface.

!! If IP-Address of the tunnel is negotiated,

!!   FlexVPN server is capable of assigning an IP through Config-Set

interface Tunnel0

ip unnumbered Ethernet0/1

tunnel source Ethernet0/0

tunnel destination dynamic

tunnel protection ipsec profile FlexClient-IPSec

!! Final FlexVPN client Part.

!! Multiple backup Peer and/or Multiple Tunnel source interfaces can be configured

crypto ikev2 client flexvpn FlexClient

peer 1 10.0.0.2

client connect Tunnel0

!! WAN interface

interface Ethernet0/0

ip address 10.1.1.4 255.255.255.248

!! LAN Interface

interface Ethernet0/1

ip address 10.10.3.1 255.255.255.0

Hinweis zu Client-Zertifikaten

FlexVPN erfordert, dass das Client-Zertifikat über ein EKU von Client Auth (OID = 1.3.6.1.5.7.3.2) mit den KU-Attributen Digital Signature und Key Encipherment verfügt, damit das Zertifikat vom Server akzeptiert werden kann.

Spoke3#show crypto pki certificates verbose

Certificate

Status: Available

Version: 3

Certificate Serial Number (hex): 08

Certificate Usage: General Purpose

Issuer:

l=lal-bagh

c=IN

o=Cisco

ou=TAC

cn=Praveen

Subject:

Name: spoke3.cisco.com

ou=FlexVPN

cn=spoke3.cisco.com

<snip>

Subject Key Info:

Public Key Algorithm: rsaEncryption

RSA Public Key: (1024 bit)

Signature Algorithm: MD5 with RSA Encryption

Fingerprint MD5: 2381D319 906177E1 F45019BC 61059BD5

Fingerprint SHA1: D81FD705 653547F2 D0916710 E6B096A1 23F6C467

X509v3 extensions:

X509v3 Key Usage: E0000000

Digital Signature

Non Repudiation

Key Encipherment

<snip>

Extended Key Usage:

Client Auth

Server Auth

Associated Trustpoints: Spoke3-Flex

Storage: nvram:lal-bagh#8.cer

Key Label: Spoke3-Flex

Key storage device: private config

CA Certificate

<snip>

Überprüfung des FlexVPN-Betriebs

FlexVPN-Server

FlexServer#show crypto ikev2 session

IPv4 Crypto IKEv2 Session

Session-id:5, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local                 Remote                fvrf/ivrf            Status

1         10.0.0.2/500          10.1.1.4/500          none/none            READY

Encr: AES-CBC, keysize: 192, Hash: SHA512, DH Grp:5, Auth sign: RSA, Auth verify:

RSA

Life/Active Time: 86400/7199 sec

Child sa: local selector  10.0.0.2/0 - 10.0.0.2/65535

remote selector 10.1.1.4/0 - 10.1.1.4/65535

ESP spi in/out: 0xA9571C00/0x822DDAAD

FlexServer#show crypto ikev2 session detailed

IPv4 Crypto IKEv2 Session

Session-id:5, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local                 Remote                fvrf/ivrf            Status

1         10.0.0.2/500          10.1.1.4/500          none/none            READY

Encr: AES-CBC, keysize: 192, Hash: SHA512, DH Grp:5, Auth sign: RSA, Auth verify:

RSA

Life/Active Time: 86400/7244 sec

CE id: 1016, Session-id: 5

Status Description: Negotiation done

Local spi: 648921093349609A       Remote spi: 1C2FFF727C8EA465

Local id: flexserver.cisco.com

Remote id: spoke3.cisco.com

Local req msg id:  2              Remote req msg id:  5

Local next msg id: 2              Remote next msg id: 5

Local req queued:  2              Remote req queued:  5

Local window:      5              Remote window:      5

DPD configured for 0 seconds, retry 0

NAT-T is not detected

Cisco Trust Security SGT is disabled

Initiator of SA : No

Remote subnets:

10.10.3.0 255.255.255.0

Child sa: local selector  10.0.0.2/0 - 10.0.0.2/65535

remote selector 10.1.1.4/0 - 10.1.1.4/65535

ESP spi in/out: 0xA9571C00/0x822DDAAD

AH spi in/out: 0x0/0x0

CPI in/out: 0x0/0x0

Encr: AES-CBC, keysize: 128, esp_hmac: SHA96

ah_hmac: None, comp: IPCOMP_NONE, mode transport

FlexServer#show ip route static

10.0.0.0/8 is variably subnetted, 9 subnets, 4 masks

S        10.10.3.0/30 is directly connected, Virtual-Access1

FlexServer#ping 10.10.3.1 repeat 100

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 10.10.3.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (100/100), round-trip min/avg/max = 1/5/13 ms

FlexServer#show crypto ipsec sa | I ident|caps|spi

local  ident (addr/mask/prot/port): (10.0.0.2/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (10.1.1.4/255.255.255.255/47/0)

#pkts encaps: 205, #pkts encrypt: 205, #pkts digest: 205

#pkts decaps: 200, #pkts decrypt: 200, #pkts verify: 200

current outbound spi: 0x822DDAAD(2184043181)

spi: 0xA9571C00(2841058304)

spi: 0x822DDAAD(2184043181)

FlexVPN Remote

Spoke3#show crypto ikev2 session

IPv4 Crypto IKEv2 Session

Session-id:4, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local                 Remote                fvrf/ivrf            Status

1         10.1.1.4/500          10.0.0.2/500          none/none            READY

Encr: AES-CBC, keysize: 192, Hash: SHA512, DH Grp:5, Auth sign: RSA, Auth verify:

RSA

Life/Active Time: 86400/7621 sec

Child sa: local selector  10.1.1.4/0 - 10.1.1.4/65535

remote selector 10.0.0.2/0 - 10.0.0.2/65535

ESP spi in/out: 0x822DDAAD/0xA9571C00

Spoke3#show crypto ikev2 session detailed

IPv4 Crypto IKEv2 Session

Session-id:4, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local                 Remote                fvrf/ivrf            Status

1         10.1.1.4/500          10.0.0.2/500          none/none            READY

Encr: AES-CBC, keysize: 192, Hash: SHA512, DH Grp:5, Auth sign: RSA, Auth verify:

RSA

Life/Active Time: 86400/7612 sec

CE id: 1016, Session-id: 4

Status Description: Negotiation done

Local spi: 1C2FFF727C8EA465       Remote spi: 648921093349609A

Local id: spoke3.cisco.com

Remote id: flexserver.cisco.com

Local req msg id:  5              Remote req msg id:  2

Local next msg id: 5              Remote next msg id: 2

Local req queued:  5              Remote req queued:  2

Local window:      5              Remote window:      5

DPD configured for 0 seconds, retry 0

NAT-T is not detected

Cisco Trust Security SGT is disabled

Initiator of SA : Yes

Default Domain: cisco.com

Remote subnets:

10.10.10.1 255.255.255.255

10.10.0.0 255.255.255.0

Child sa: local selector  10.1.1.4/0 - 10.1.1.4/65535

remote selector 10.0.0.2/0 - 10.0.0.2/65535

ESP spi in/out: 0x822DDAAD/0xA9571C00

AH spi in/out: 0x0/0x0

CPI in/out: 0x0/0x0

Encr: AES-CBC, keysize: 128, esp_hmac: SHA96

ah_hmac: None, comp: IPCOMP_NONE, mode transport

Spoke3#ping 10.10.0.1 repeat 100

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 10.10.0.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (100/100), round-trip min/avg/max = 1/5/12 ms

Spoke3#show crypto ipsec sa | I ident|caps|spi

local  ident (addr/mask/prot/port): (10.1.1.4/255.255.255.255/47/0)

remote ident (addr/mask/prot/port): (10.0.0.2/255.255.255.255/47/0)

#pkts encaps: 300, #pkts encrypt: 300, #pkts digest: 300

#pkts decaps: 309, #pkts decrypt: 309, #pkts verify: 309

current outbound spi: 0xA9571C00(2841058304)

spi: 0x822DDAAD(2184043181)

spi: 0xA9571C00(2841058304)

Zugehörige Informationen

- FlexVPN: IKEv2 mit integriertem Windows-Client und ZertifikatauthentifizierungHinweis

- FlexVPN und AnyConnect IKEv2 Client - Konfigurationsbeispiel TechHinweis

- FlexVPN-Bereitstellung: AnyConnect IKEv2 Remote Access mit EAP-MD5 TechHinweis

- Technischer Hinweis zum Debuggen von IKEv2-Paketen für Exchange und Protokollebene

- Cisco FlexVPN

- IPSec-Aushandlung/IKE-Protokolle

- Cisco AnyConnect Secure Mobility Client

- Cisco VPN-Client

- Technischer Support und Dokumentation - Cisco Systems