Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hintergrundinformationen

Konfigurieren

Netzwerkdiagramm

Konfigurieren des Microsoft L2TP-Clients

Zertifikate für die PIX-Firewall abrufen

PIX-Firewall-Konfiguration

Überprüfen

Fehlerbehebung

Befehle zur Fehlerbehebung

Beispielausgabe für Debugging

Gute Debug für die Registrierung bei CA

Schlechte Fehlerbehebung für die Registrierung bei CA

Zugehörige Informationen

Einführung

Layer 2 Tunneling Protocol (L2TP) über IPsec wird von der Cisco Secure PIX Firewall Software 6.x oder höher unterstützt. Benutzer, die Windows 2000 ausführen, können den nativen IPsec-Client und den L2TP-Client verwenden, um einen L2TP-Tunnel zur PIX-Firewall einzurichten. Der Datenverkehr fließt durch den L2TP-Tunnel, der durch IPsec Security Associations (SAs) verschlüsselt wird.

Hinweis: Sie können den L2TP-IPsec-Client von Windows 2000 nicht für Telnet zum PIX verwenden.

Hinweis: Split Tunneling ist für L2TP auf dem PIX nicht verfügbar.

Zur Konfiguration von L2TP über IPsec von Microsoft Windows 200/2003- und XP-Clients in einem PIX/ASA Security Appliance-Firmenbüro mithilfe von vorinstallierten Schlüsseln mit einem Microsoft Windows 2003 Internet Authentication Service (IAS) RADIUS Server für die Benutzerauthentifizierung, siehe L2TP Over IPsec Between Windows 200/XP PC and PIX/ASA 7.2 mit Konfigurationsbeispiel für einen vorinstallierten Schlüssel.

Informationen zum Konfigurieren von L2TP over IP Security (IPsec) von Microsoft Windows 2000- und XP-Remote-Clients zu einem Firmenstandort mithilfe einer verschlüsselten Methode finden Sie unter Konfigurieren von L2TP über IPSec von einem Windows 2000- oder XP-Client zu einem Cisco VPN-Konzentrator der Serie 300 mithilfe von vorinstallierten Schlüsseln.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Die Informationen in diesem Dokument gelten für die folgenden Software- und Hardwareversionen:

- PIX Softwareversion 6.3(3)

- Windows 2000 mit oder ohne SP2 (Informationen zu SP1 finden Sie im Microsoft Tipp Q276360 )

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps zu Konventionen von Cisco).

Hintergrundinformationen

Die Zertifikatunterstützung in Cisco Secure PIX 6.x oder höher umfasst Baltimore-, Microsoft-, VeriSign- und Entrust-Server. Derzeit akzeptiert PIX keine L2TP-Anfragen ohne IPsec-Schutz.

Dieses Beispiel zeigt, wie die PIX-Firewall für das oben in diesem Dokument beschriebene Szenario konfiguriert wird. Die Internet Key Exchange (IKE)-Authentifizierung verwendet den Befehl rsa-sig (Zertifikate). In diesem Beispiel erfolgt die Authentifizierung über einen RADIUS-Server.

Weniger verbundene Optionen für verschlüsselte Client-Verbindungen zum PIX sind unter Cisco Hardware- und VPN-Clients aufgeführt, die IPSec/PPTP/L2TP unterstützen.

Konfigurieren

In diesem Abschnitt erhalten Sie Informationen zum Konfigurieren der in diesem Dokument beschriebenen Funktionen.

Hinweis: Verwenden Sie das Command Lookup Tool (nur registrierte Kunden), um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten.

Netzwerkdiagramm

In diesem Dokument wird die folgende Netzwerkeinrichtung verwendet:

Konfigurieren des Microsoft L2TP-Clients

Informationen zur Konfiguration des Microsoft L2TP-Clients finden Sie in Microsoft's Step-by-Step Guide to Internet Protocol Security .

Wie in der von Microsoft erwähnten schrittweisen Anleitung beschrieben, unterstützt der Client eine Reihe von getesteten Zertifizierungsstellen-Servern (Certificate Authority, CA). Informationen zum Einrichten der Microsoft CA finden Sie in Microsoft's Schrittanleitung zum Einrichten einer Zertifizierungsstelle .

Zertifikate für die PIX-Firewall abrufen

Weitere Informationen zur Konfiguration von PIX für die Interoperabilität mit Zertifikaten von VeriSign, Entrust, Baltimore und Microsoft finden Sie in den CA-Konfigurationsbeispielen.

PIX-Firewall-Konfiguration

In diesem Dokument wird diese Konfiguration verwendet.

PIX-Firewall

PIX Version 6.3(3)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname PIX-506-2

domain-name sjvpn.com

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

fixup protocol skinny 2000

names

!--- Access Control List (ACL) configured to bypass !--- Network Address Translation (NAT) for the L2TP IP pool.

access-list nonat permit ip 20.1.1.0 255.255.255.0 50.1.1.0 255.255.255.0

!--- ACL configured to permit L2TP traffic (UDP port 1701).

access-list l2tp permit udp host 171.68.9.57 any eq 1701

no pager

logging on

logging console debugging

logging buffered debugging

interface ethernet0 10baset

interface ethernet1 10baset

mtu outside 1500

mtu inside 1500

ip address outside 171.68.9.57 255.255.255.0

ip address inside 20.1.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

!--- Pool for L2TP address assignment.

ip local pool l2tp 50.1.1.1-50.1.1.5

pdm history enable

arp timeout 14400

!--- NAT configuration that matches previously defined !--- ACL for the L2TP IP pool.

nat (inside) 0 access-list nonat

route outside 0.0.0.0 0.0.0.0 171.68.9.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

!--- AAA (RADIUS) server configuration.

aaa-server RADIUS (inside) host 20.1.1.2 cisco timeout 5

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

!--- sysopt command entry to permit L2TP !--- traffic, while bypassing all ACLs.

sysopt connection permit-l2tp

no sysopt route dnat

!--- The IPsec configuration.

crypto ipsec transform-set l2tp esp-des esp-md5-hmac

!--- Only transport mode is supported.

crypto ipsec transform-set l2tp mode transport

crypto ipsec security-association lifetime seconds 3600

crypto dynamic-map dyna 20 match address l2tp

crypto dynamic-map dyna 20 set transform-set l2tp

crypto map mymap 10 ipsec-isakmp dynamic dyna

crypto map mymap client authentication RADIUS

crypto map mymap interface outside

!--- The IKE configuration.

isakmp enable outside

isakmp policy 20 authentication rsa-sig

isakmp policy 20 encryption des

isakmp policy 20 hash md5

isakmp policy 20 group 1

isakmp policy 20 lifetime 86400

ca identity sjvpn 171.68.9.149:/certsrv/mscep/mscep.dll

ca configure sjvpn ra 1 20 crloptional

telnet 171.68.9.0 255.255.255.0 inside

telnet 20.1.1.2 255.255.255.255 inside

telnet timeout 60

ssh timeout 5

!--- The L2TP configuration parameters.

vpdn group l2tpipsec accept dialin l2tp

vpdn group l2tpipsec ppp authentication chap

vpdn group l2tpipsec ppp authentication mschap

vpdn group l2tpipsec client configuration address local l2tp

vpdn group l2tpipsec client configuration dns 20.1.1.250 20.1.1.251

vpdn group l2tpipsec client configuration wins 20.1.1.250

vpdn group l2tpipsec client authentication aaa RADIUS

vpdn group l2tpipsec client accounting RADIUS

vpdn group l2tpipsec l2tp tunnel hello 60

vpdn enable outside

terminal width 80

Cryptochecksum:06a53009d1e9f04740256d9f0fb82837

: end

[OK]

Überprüfen

In diesem Abschnitt überprüfen Sie, ob Ihre Konfiguration ordnungsgemäß funktioniert.

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

- show crypto ca cert: Zeigt Informationen über Ihr Zertifikat, das Zertifikat der Zertifizierungsstelle und alle Zertifizierungsstellen-Zertifikate an.

Certificate

Status: Available

Certificate Serial Number: 03716308000000000022

Key Usage: General Purpose

Subject Name

Name: PIX-506-2.sjvpn.com

Validity Date:

start date: 16:29:10 Apr 27 2001

end date: 16:39:10 Apr 27 2002

RA Signature Certificate

Status: Available

Certificate Serial Number: 0347dc82000000000002

Key Usage: Signature

CN = scott

OU = tac

O = cisco

L = san jose

ST = ca

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 18:47:45 Jul 27 2000

end date: 18:57:45 Jul 27 2001

CA Certificate

Status: Available

Certificate Serial Number: 1102485095cbf8b3415b2e96e86800d1

Key Usage: Signature

CN = zakca

OU = vpn

O = cisco

L = sj

ST = california

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 03:15:09 Jul 27 2000

end date: 03:23:48 Jul 27 2002

RA KeyEncipher Certificate

Status: Available

Certificate Serial Number: 0347df0d000000000003

Key Usage: Encryption

CN = scott

OU = tac

O = cisco

L = san jose

ST = ca

C = US

EA =<16> zaahmed@cisco.com

Validity Date:

start date: 18:47:46 Jul 27 2000

end date: 18:57:46 Jul 27 2001

- show crypto isakmp sa: Zeigt alle aktuellen IKE-SAs in einem Peer an.

dst src state pending created

171.68.9.57 171.68.9.149 QM_IDLE 0 1

- show crypto ipsec sa: Zeigt die von aktuellen SAs verwendeten Einstellungen an.

interface: outside

Crypto map tag: mymap, local addr. 171.68.9.57

local ident (addr/mask/prot/port): (171.68.9.57/255.255.255.255/17/1701)

remote ident (addr/mask/prot/port): (171.68.9.149/255.255.255.255/17/1701)

current_peer: 171.68.9.149

dynamic allocated peer ip: 0.0.0.0

PERMIT, flags={reassembly_needed,transport_parent,}

#pkts encaps: 20, #pkts encrypt: 20, #pkts digest 20

#pkts decaps: 45, #pkts decrypt: 45, #pkts verify 45

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 0, #pkts compr. failed: 0, #pkts decompress failed: 0

#send errors 0, #recv errors 0

local crypto endpt.: 171.68.9.57, remote crypto endpt.: 171.68.9.149

path mtu 1500, ipsec overhead 36, media mtu 1500

current outbound spi: a8c54ec8

inbound esp sas:

spi: 0xfbc9db43(4224310083)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 1, crypto map: mymap

sa timing: remaining key lifetime (k/sec): (99994/807)

IV size: 8 bytes

replay detection support: Y

inbound ah sas:

inbound pcp sas:

outbound esp sas:

spi: 0xa8c54ec8(2831503048)

transform: esp-des esp-md5-hmac ,

in use settings ={Transport, }

slot: 0, conn id: 2, crypto map: mymap

sa timing: remaining key lifetime (k/sec): (99999/807)

IV size: 8 bytes

replay detection support: Y

outbound ah sas:

outbound pcp sas:

- show vpdn tunnel: Zeigt Informationen über aktive L2TP- oder L2F-Tunnel (Level 2 Forwarding) in einem Virtual Private Dialup Network (VPDN) an.

L2TP Tunnel Information (Total tunnels=1 sessions=1)

Tunnel id 4 is up, remote id is 19, 1 active sessions

Tunnel state is established, time since change 96 secs

Remote Internet Address 171.68.9.149, port 1701

Local Internet Address 171.68.9.57, port 1701

15 packets sent, 38 received, 420 bytes sent, 3758 received

Control Ns 3, Nr 5

Local RWS 16, Remote RWS 8

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs 3

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

% No active PPTP tunnels

PIX-506-2# sh uauth

Current Most Seen

Authenticated Users 1 2

Authen In Progress 0 2

vpdn user 'vpnclient' at 50.1.1.1, authenticated

- show vpdn session: Zeigt Informationen über aktive L2TP- oder L2F-Sitzungen in einem VPDN an.

L2TP Session Information (Total tunnels=1 sessions=1)

Call id 4 is up on tunnel id 4

Remote tunnel name is zaahmed-pc

Internet Address is 171.68.9.149

Session username is vpnclient, state is established

Time since change 201 secs, interface outside

Remote call id is 1

PPP interface id is 1

15 packets sent, 56 received, 420 bytes sent, 5702 received

Sequencing is off

- show vpdn ppinterface - Zeigt den Status und die Statistiken der virtuellen PPP-Schnittstelle an, die für den PPTP-Tunnel für den Schnittstellenidentifizierungswert aus dem Befehl show vpdn session erstellt wurde.

PPP virtual interface id = 1

PPP authentication protocol is CHAP

Client ip address is 50.1.1.1

Transmitted Pkts: 15, Received Pkts: 56, Error Pkts: 0

MPPE key strength is None

MPPE_Encrypt_Pkts: 0, MPPE_Encrypt_Bytes: 0

MPPE_Decrypt_Pkts: 0, MPPE_Decrypt_Bytes: 0

Rcvd_Out_Of_Seq_MPPE_Pkts: 0

- show uauth: Zeigt aktuelle Informationen zur Benutzerauthentifizierung und -autorisierung an.

Current Most Seen

Authenticated Users 1 2

Authen In Progress 0 2

vpdn user 'vpnclient' at 50.1.1.1, authenticated

Fehlerbehebung

Dieser Abschnitt enthält Informationen zur Fehlerbehebung in Ihrer Konfiguration.

Befehle zur Fehlerbehebung

Das Output Interpreter Tool (nur registrierte Kunden) (OIT) unterstützt bestimmte show-Befehle. Verwenden Sie das OIT, um eine Analyse der Ausgabe des Befehls show anzuzeigen.

Hinweis: Beachten Sie vor der Verwendung von Debug-Befehlen die Informationen zu Debug-Befehlen.

- debug crypto ipsec: Zeigt IPsec-Ereignisse an.

- debug crypto isakmp: Zeigt Meldungen über IKE-Ereignisse an.

- debug crypto engine - Zeigt Debugmeldungen über Krypto Engines an, die Verschlüsselung und Entschlüsselung durchführen.

- debug ppp io: Zeigt die Paketinformationen für die virtuelle PPTP PPP-Schnittstelle an.

- debug crypto ca: Zeigt Debug-Meldungen an, die mit der CA ausgetauscht werden.

- debug ppp error (ppp-Fehler debug): Zeigt Protokollfehler und Fehlerstatistiken an, die mit der PPP-Verbindungsverhandlung und -Operation verknüpft sind.

- debug vpdn error (vpdn-Fehler debug): Zeigt Fehler an, die das Herstellen eines PPP-Tunnels verhindern, oder Fehler, die das Schließen eines etablierten Tunnels verursachen.

- debug vpdn paket: Zeigt L2TP-Fehler und -Ereignisse an, die Teil der normalen Tunneleinrichtung oder des normalen Tunnelabschaltens für VPDNs sind.

- debug vpdn event (vpdn-Ereignis debug): Zeigt Meldungen über Ereignisse an, die zum normalen PPP-Tunnelaufbau oder -Herunterfahren gehören.

- debug ppp uauth: Zeigt die Debug-Meldungen zur AAA-Benutzerauthentifizierung für die virtuelle PPTP PPP-Schnittstelle an.

Beispielausgabe für Debugging

Dies ist ein Beispiel für ein gutes Debuggen auf der PIX-Firewall.

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

ISAKMP: Created a peer node for 171.68.9.149

OAK_MM exchange

ISAKMP (0): processing SA payload. message ID = 0

ISAKMP (0): Checking ISAKMP transform 1 against priority 20 policy

ISAKMP: encryption DES-CBC

ISAKMP: hash MD5

ISAKMP: default group 1

ISAKMP: auth RSA sig

ISAKMP: life type in seconds

ISAKMP: life duration (VPI) of 0x0 0x0 0xe 0x10

ISAKMP (0): atts are acceptable. Next payload is 0

ISAKMP (0): processing vendor id payload

ISAKMP (0): speaking to a MSWIN2K client

ISAKMP (0): SA is doing RSA signature authentication using id type ID_FQDN

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_MM exchange

ISAKMP (0): processing KE payload. message ID = 0

ISAKMP (0): processing NONCE payload. message ID = 0

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_MM exchange

ISAKMP (0): processing ID payload. message ID = 0

ISAKMP (0): processing CERT payload. message ID = 0

ISAKMP (0): processing a CT_X509_SIGNATURE cert

CRYPTO_PKI: status = 0: crl check ignored

PKI: key process suspended and continued

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: cert revocation status unknown.

ISAKMP (0): cert approved with warning

ISAKMP (0): processing SIG payload. message ID = 0

ISAKMP (0): processing CERT_REQ payload. message ID = 0

ISAKMP (0): peer wants a CT_X509_SIGNATURE cert

ISAKMP (0): SA has been authenticated

ISAKMP (0): ID payload

next-payload : 6

type : 2

protocol : 17

port : 500

length : 23

ISAKMP (0): Total payload length: 27

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_IDLE

ISAKMP (0): processing SA payload. message ID = 3800855889

ISAKMP : Checking IPSec proposal 1

ISAKMP: transform 1, ESP_DES

ISAKMP: attributes in transform:

ISAKMP: SA life type in seconds

ISAKMP: SA life duration (VPI) of 0x0 0x0 0x3 0x84

ISAKMP: SA life type in kilobytes

ISAKMP: SA life duration (VPI) of 0x0 0x1 0x86 0xa0

ISAKMP: encaps is 2

ISAKMP: authenticator is HMAC-MD5

ISAKMP (0): atts are acceptable.IPSEC(validate_proposal_request): proposal part #1,

(key eng. msg.) dest= 171.68.9.57, src= 171.68.9.149,

dest_proxy= 171.68.9.57/255.255.255.255/17/1701 (type=1),

src_proxy= 171.68.9.149/255.255.255.255/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 0s and 0kb,

spi= 0x0(0), conn_id= 0, keysize= 0, flags= 0x0

ISAKMP (0): processing NONCE payload. message ID = 3800855889

ISAKMP (0): processing ID payload. message ID = 3800855889

ISAKMP (0): ID_IPV4_ADDR src 171.68.9.149 prot 17 port 1701

ISAKMP (0): processing ID payload. message ID = 3800855889

ISAKMP (0): ID_IPV4_ADDR dst 171.68.9.57 prot 17 port 1701IPSEC(key_engine):

got a queue event...

IPSEC(spi_response): getting spi 0xfbc9db43(4224310083) for SA

from 171.68.9.149 to 171.68.9.57 for prot 3

return status is IKMP_NO_ERROR

crypto_isakmp_process_block: src 171.68.9.149, dest 171.68.9.57

OAK_QM exchange

oakley_process_quick_mode:

OAK_QM_AUTH_AWAIT

ISAKMP (0): Creating IPSec SAs

inbound SA from 171.68.9.149 to 171.68.9.57 (proxy 171.68.9.149 to 171.68.9.57)

has spi 4224310083 and conn_id 1 and flags 0

lifetime of 900 seconds

lifetime of 100000 kilobytes

outbound SA from 171.68.9.57 to 171.68.9.149 (proxy 171.68.9.57 to 171.68.9.149)

has spi 2831503048 and conn_id 2 and flags 0

lifetime of 900 seconds

lifetime of 100000 kilobytesIPSEC(key_engine): got a queue event...

IPSEC(initialize_sas): ,

(key eng. msg.) dest= 171.68.9.57, src= 171.68.9.149,

dest_proxy= 171.68.9.57/0.0.0.0/17/1701 (type=1),

src_proxy= 171.68.9.149/0.0.0.0/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 900s and 100000kb,

spi= 0xfbc9db43(4224310083), conn_id= 1, keysize= 0, flags= 0x0

IPSEC(initialize_sas): ,

(key eng. msg.) src= 171.68.9.57, dest= 171.68.9.149,

src_proxy= 171.68.9.57/0.0.0.0/17/1701 (type=1),

dest_proxy= 171.68.9.149/0.0.0.0/17/1701 (type=1),

protocol= ESP, transform= esp-des esp-md5-hmac ,

lifedur= 900s and 100000kb,

spi= 0xa8c54ec8(2831503048), conn_id= 2, keysize= 0, flags= 0x0

return status is IKMP_NO_ERROR

show log

603102: PPP virtual interface 1 - user: vpnclient aaa authentication started

603103: PPP virtual interface 1 - user: vpnclient aaa authentication succeed

109011: Authen Session Start: user 'vpnclient', sid 0

603106: L2TP Tunnel created, tunnel_id is 1, remote_peer_ip is 171.68.9.149

ppp_virtual_interface_id is 1, client_dynamic_ip is 50.1.1.1

username is vpnclient

Gute Debug für die Registrierung bei CA

CI thread sleeps!

Crypto CA thread wakes up!%

% Start certificate enrollment ..

% The subject name in the certificate will be: PIX-506-2.sjvpn.com

CI thread wakes up!% Certificate request sent to Certificate Authority

% The certificate request fingerprint will be displayed.

PIX-506-2(config)#

PIX-506-2(config)#     Fingerprint:  d8475977 7198ef1f 17086f56 9e3f7a89

CRYPTO_PKI: transaction PKCSReq completed

CRYPTO_PKI: status:

Crypto CA thread sleeps!

PKI: key process suspended and continued

CRYPTO_PKI: http connection opened

CRYPTO_PKI:  received msg of 711 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 33

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 70 0d 4e e8 03 09 71 4e c8 24 7a 2b 03 70 55 97

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 102: certificate request pending

CRYPTO_PKI: http connection opened

CRYPTO_PKI:  received msg of 711 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 33

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 c8 9f 97 4d 88 24 92 a5 3b ba 9e bc d6 7c 75 57

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 102: certificate request pending

!--- After approval from CA.

Crypto CA thread wakes up!

CRYPTO_PKI: resend GetCertInitial, 1

Crypto CA thread sleeps!

CRYPTO_PKI: resend GetCertInitial for session: 0

CRYPTO_PKI: http connection opened

The certificate has been granted by CA!

CRYPTO_PKI:  received msg of 1990 bytes

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

PKI: key process suspended and continued

CRYPTO_PKI: signed attr: pki-message-type:

13 01 33

CRYPTO_PKI: signed attr: pki-status:

13 01 30

CRYPTO_PKI: signed attr: pki-recipient-nonce:

04 10 c8 9f 97 4d 88 24 92 a5 3b ba 9e bc d6 7c 75 57

CRYPTO_PKI: signed attr: pki-transaction-id:

13 20 65 66 31 32 32 31 30 33 31 37 30 61 30 38 65 32 33 38

38 35 61 36 30 65 32 35 31 31 34 66 62 37

CRYPTO_PKI: status = 100: certificate is granted

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

CRYPTO_PKI: All enrollment requests completed.

CRYPTO_PKI: All enrollment requests completed.

CRYPTO_PKI: WARNING: Certificate, private key or CRL was not found

while selecting CRL

Schlechte Fehlerbehebung für die Registrierung bei CA

In diesem Beispiel wurde die falsche URL-Syntax im Befehl ca identity verwendet:

CI thread sleeps!

Crypto CA thread wakes up!

CRYPTO_PKI: http connection opened

msgsym(GETCARACERT, CRYPTO)!

%Error in connection to Certificate Authority: status = FAIL

CRYPTO_PKI: status = 266: failed to verify

CRYPTO_PKI: transaction GetCACert completed

Crypto CA thread sleeps!

Wenn der Registrierungsmodus als CA statt als RA angegeben wurde, wird folgender Debugger angezeigt:

CI thread sleeps!

Crypto CA thread wakes up!

CRYPTO_PKI: http connection opened

Certificate has the following attributes:

Fingerprint: 49dc7b2a cd5fc573 6c774840 e58cf178

CRYPTO_PKI: transaction GetCACert completed

CRYPTO_PKI: Error:  Invalid format for BER encoding while

CRYPTO_PKI: can not set ca cert object.

CRYPTO_PKI: status = 65535: failed to process RA certiifcate

Crypto CA thread sleeps!

In diesem Beispiel fehlt der Befehl mode transport:

ISAKMP:      SA life type in seconds

ISAKMP:      SA life duration (VPI) of  0x0 0x0 0x70 0x80

ISAKMP:      SA life type in kilobytes

ISAKMP:      SA life duration (VPI) of  0x0 0x46 0x50 0x0

ISAKMP:      encaps is 2

ISAKMP:      authenticator is HMAC-MD5IPSEC(validate_proposal):

invalid transform proposal flags -- 0x0

In dieser Ausgabe fehlt der Befehl crypto map mymap 10 ipsec-isakmp dynamic dyna, und diese Meldung kann im Debugging angezeigt werden:

no IPSEC cryptomap exists for local address a.b.c.d

Zugehörige Informationen

- Support-Seiten für RADIUS-Technologie

- PIX-Befehlsreferenz

- PIX-Support-Seite

- Support-Seite für IPsec-Aushandlung/IKE-Protokolle

- Anforderungen für Kommentare (RFCs)