Inhalt

Einführung

Vorbereitungen

Konventionen

Voraussetzungen

Verwendete Komponenten

Konfiguration

Netzwerkdiagramm

Konfigurationen

RADIUS-Profile

Überprüfung

Fehlerbehebung

Was ist die SSD 2.5.1-Funktion für die einmalige Anmeldung?

Was muss ich vor der Konfiguration von SSG und SSD wissen?

Was kann ich tun, nachdem die PPPoA-Sitzung initiiert wurde, aber bevor eine SSD-Anmeldung eingerichtet wurde?

Wie kann ich die SSD-Funktion zur einmaligen Anmeldung testen?

Wie führe ich SSD-Debuggen aus?

Beispielausgabe für Debugging

NRP1-Ausgang

L2TP Access Concentrator (LAC)-Ausgabe

LNS-Ausgabe

Zugehörige Informationen

Einführung

Die in diesem Dokument beschriebene Beispielkonfiguration zeigt einen Remote-Client, der über Point-to-Point Protocol over Asynchronous Transfer Mode (PPPoA) auf ein Internet Service Provider (ISP)-Netzwerk zugreift.

Der Remote-Client möchte über das Layer 3 Service Selection Gateway/Service Selection Dashboard (SSG/SSD) auf einen Layer 2 Tunneling Protocol (L2TP)-Service zugreifen. Der L2TP-Dienst wird in der Konfiguration mit der Host-IP-Adresse 15.15.15.5 dargestellt. Mithilfe des Dynamic Host Configuration Protocol (DHCP) stellt der Cisco 677 eine IP-Adresse für den PC bereit, die aus einem IP-Adresspool von 10.0.0.2 bis 10.0.0.254 mit der Maske 255.255.255.0 besteht. Darüber hinaus ist die Port Address Translation (PAT) auf dem Cisco 677 aktiviert.

Für diese Beispielkonfiguration gibt es drei Tests:

- Das SSG-bezogene Debuggen während verschiedener Schritte der Dienstanmeldung durch den Remoteclient.

- SSD 2.5.1 mit Single Sign-On

- Aktivieren des SSD-Debuggens

Vorbereitungen

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie unter Cisco Technical Tips Conventions (Technische Tipps von Cisco zu Konventionen).

Voraussetzungen

Es sind keine besonderen Voraussetzungen erforderlich, um den Inhalt dieses Dokuments nachzuvollziehen.

Verwendete Komponenten

Die Informationen in diesem Dokument basieren auf den unten stehenden Software- und Hardwareversionen.

- Cisco C6400R-Software (C6400R-G4P5-M), Version 12.1(5)DC1

- Cisco 7200 Software (C7200-IS-M), Version 12.2(1)

Die Informationen in diesem Dokument beziehen sich auf Geräte in einer speziell eingerichteten Testumgebung. Alle Geräte, die in diesem Dokument benutzt wurden, begannen mit einer gelöschten (Nichterfüllungs) Konfiguration. Wenn sich Ihr Netzwerk in der Produktionsumgebung befindet, müssen Sie sich bei jedem Befehl zunächst dessen potenzielle Auswirkungen vor Augen führen.

Konfiguration

In diesem Abschnitt erfahren Sie, wie Sie die in diesem Dokument beschriebenen Funktionen konfigurieren können.

Hinweis: Um weitere Informationen zu den in diesem Dokument verwendeten Befehlen zu erhalten, verwenden Sie das Command Lookup Tool (nur registrierte Kunden).

Netzwerkdiagramm

In diesem Dokument wird die im Diagramm unten dargestellte Netzwerkeinrichtung verwendet.

Konfigurationen

In diesem Dokument werden die unten angegebenen Konfigurationen verwendet.

- Cisco 6400 LAC (airelle_nrp3)

- Cisco 7204 LNS (Hostname, Vorname)

- Cisco 677

Cisco 6400 LAC (airelle_nrp3)

Building configuration...

Current configuration : 125008 bytes

!

! Last configuration change at 02:11:30 UTC Mon Jun 18 2001

! NVRAM config last updated at 00:43:51 UTC Mon Jun 18 2001

!

version 12.1

no service single-slot-reload-enable

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname arielle_nrp3

!

boot system tftp c6400r-g4p5-mz.121-5.DC1 172.17.247.195

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default none

aaa authentication login tty enable

aaa authentication ppp ayman group radius

aaa nas port extended

enable password ww

!

username ayman@cairo.com password 0 ayman

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip cef

no ip finger

no ip domain-lookup

!

!

vpdn enable

no vpdn logging

vpdn search-order domain

!

!

ssg enable

ssg default-network 10.200.56.0 255.255.255.0

ssg service-password cisco

ssg radius-helper auth-port 1645 acct-port 1646

ssg radius-helper key cisco

ssg next-hop download nxthoptbl cisco

ssg bind direction downlink Virtual-Template66

ssg service-search-order remote local

!

!

interface Loopback3

ip address 200.200.200.1 255.255.255.252

!

!

interface ATM0/0/0.61 point-to-point

description LAC L2TP connection to Ior

ip address 14.14.14.6 255.255.255.252

pvc 61/61

broadcast

encapsulation aal5snap

!

!

!

interface ATM0/0/0.5555 multipoint

pvc 66/66

encapsulation aal5mux ppp Virtual-Template66

!

!

!

interface Ethernet0/0/1

no ip address

!

interface Ethernet0/0/0

ip address 3.0.0.2 255.255.255.0

no ip mroute-cache

shutdown

tag-switching ip

!

interface FastEthernet0/0/0

ip address 10.200.56.6 255.255.255.0

no ip mroute-cache

half-duplex

!

!

interface Virtual-Template66

ip unnumbered Loopback3

peer default ip address pool ayman

ppp authentication pap ayman

!

!

router eigrp 5

network 14.14.14.4 0.0.0.3

no auto-summary

no eigrp log-neighbor-changes

!

ip local pool ayman 212.93.193.114 212.93.193.126

ip route 10.0.0.0 255.255.255.0 212.93.193.114

!

radius-server host 10.200.56.16 auth-port 1645 acct-port 1646

radius-server retransmit 3

radius-server attribute 25 nas-port format d

radius-server attribute nas-port format d

radius-server key cisco

!

!

line con 0

exec-timeout 0 0

login authentication tty

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password ww

login authentication tty

!

end

Cisco 7204 LNS (Hostname, Vorname)

Building configuration...

Current configuration : 6769 bytes

!

version 12.2

no service single-slot-reload-enable

service timestamps debug datetime msec localtime show-timezone

service timestamps log datetime localtime show-timezone

no service password-encryption

!

hostname ior

!

boot system flash c7200-is-mz.122-1.bin

logging buffered 16384 debugging

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default none

aaa authentication login tty enable

aaa authentication ppp ayman local

aaa nas port extended

enable password 7 03134C

!

username ayman@cairo.com password 0 ayman

clock timezone GMT+1 1

clock summer-time PDT recurring

ip subnet-zero

no ip source-route

ip cef

!

!

no ip finger

ip tcp window-size 8192

ip ftp username tftp

ip ftp password 7 061118

ip host rund 172.17.247.195

ip host PAGENT-SECURITY-V3 57.63.30.76 95.26.0.0

!

!

!

!

!

vpdn enable

no vpdn logging

vpdn search-order domain

!

vpdn-group 1

accept-dialin

protocol l2tp

virtual-template 24

terminate-from hostname nap

local name cairo

l2tp tunnel password 7 052827261363

!

!

interface Loopback1

ip address 212.93.194.5 255.255.255.252

!

interface Loopback2

ip address 15.15.15.5 255.255.255.252

!

!

interface FastEthernet0/0

ip address 10.200.56.2 255.255.255.0

ip ospf network point-to-multipoint

no ip mroute-cache

load-interval 60

duplex half

no cdp enable

!

interface ATM2/0

no ip mroute-cache

atm pvc 1 0 5 qsaal

atm pvc 2 0 16 ilmi

no atm ilmi-keepalive

!

!

!

!

!

interface ATM2/0.61 point-to-point

description L2TP tunnel link

ip address 14.14.14.5 255.255.255.252

pvc 61/61

broadcast

encapsulation aal5snap

!

!

interface ATM2/0.5555 multipoint

pvc 55/55

encapsulation aal5mux ppp Virtual-Template24

!

!

!

interface Virtual-Template24

ip unnumbered Loopback1

peer default ip address pool SSG-L2TP

ppp authentication pap ayman

!

!

router eigrp 5

network 14.14.14.4 0.0.0.3

network 15.15.15.4 0.0.0.3

no auto-summary

no eigrp log-neighbor-changes

!

!

ip route 212.93.193.112 255.255.255.252 14.14.14.6

ip local pool SSG-L2TP 212.93.197.114 212.93.197.126

radius-server host 10.200.56.16 auth-port 1645 acct-port 1646

radius-server retransmit 3

radius-server attribute 25 nas-port format d

radius-server attribute nas-port format d

radius-server key cisco

radius-server vsa send accounting

radius-server vsa send authentication

!

!

!

!

line con 0

exec-timeout 0 0

password 7 010411

login authentication tty

transport input none

line aux 0

password 7 021113

line vty 0 4

exec-timeout 0 0

password 7 010411

login authentication tty

line vty 5 15

!

end

!

Bevor Sie die neue Konfiguration implementieren, müssen Sie den Cisco 677 auf die Standardkonfiguration zurücksetzen. Um die Standardkonfiguration wiederherzustellen, verwenden Sie den Befehl set nvram erase. Beispiel:

cbos#set nvram erase

Erasing running configuration.

You must use "write" for changes to be permanent.

cbos#write

NVRAM written.

cbos#reboot

Durch die Aktivierung der DHCP-Serverfunktion im Cisco 677 Broadband Operating System (CBOS) wird automatisch ein Pool mit dem Namen "pool0" erstellt, und es wird ein Subnetz von 10.0.0.0 mit der Maske 255.255.255.0 zugewiesen. Standardmäßig wird der IP-Adresse der Cisco 677 Ethernet-Schnittstelle die Adresse 10.0.0.1 zugewiesen, und der "pool0" kann dann IP-Adressen zwischen 10.0.0.2 und 10.0.0.254 für die lokalen LAN-Clients/PC leasen.

Cisco 677

!--- This configuration must be done !--- after NVRAM has been erased.

set ppp wanipcp 0.0.0.0

set ppp wan0-0 login hisham

set ppp wan0-0 passward hisham

set dhcp server enabled

set nat enabled

set int wan0-0 close

set int wan0-0 vpi 1

set int wan0-0 vci 60

set int wan0-0 open

write

reboot

RADIUS-Profile

Die folgenden RADIUS-Profile (Remote Dial-In User Service) sind für den Remote-Benutzer und für die Services vorgesehen.

- Profil von Remote User Hisham

- Profil der Servicegruppenreise

- Profil der Servicegruppenstädte

- Profil des Service von cairo.com

- Profil der Next-Hop-Tabelle

Profil von Remote User Hisham

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u hisham

User Profile Information

user = hisham{

profile_id = 119

profile_cycle = 11

member = ayman

radius=SSG-6400 {

check_items= {

2=hisham

}

reply_attributes= {

6=2

7=1

9,250="GTravelling"

}

}

}

Profil der Servicegruppenreise

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u Travelling

User Profile Information

user = Travelling{

profile_id = 165

profile_cycle = 3

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,250="IMiddle East"

9,250="GCities"

}

}

}

Profil der Servicegruppenstädte

User Profile Information

user = Cities{

profile_id = 167

profile_cycle = 3

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,250="ICairo"

9,250="Ncairo.com"

}

}

}

Profil des Service von cairo.com

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u cairo.com

User Profile Information

user = cairo.com{

profile_id = 144

profile_cycle = 17

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,1="vpdn:tunnel-id=nap"

9,1="vpdn:l2tp-tunnel-password=CAIRO"

9,1="vpdn:tunnel-type=l2tp"

9,1="vpdn:ip-addresses=15.15.15.5"

9,251="Ocairo.com"

9,251="R15.15.15.4;255.255.255.252"

9,251="TT"

9,251="IEgyptian Capital"

9,251="Gcairo.com_key"

}

}

}

Profil der Next-Hop-Tabelle

root@canonball[/opt/csecure/CLI]ViewProfile -p 9900 -u nxthoptbl

User Profile Information

user = nxthoptbl{

profile_id = 168

profile_cycle = 2

member = Services

radius=SSG-6400 {

check_items= {

2=cisco

}

reply_attributes= {

6=5

9,253="Gcairo.com_key;14.14.14.5"

}

}

}

Überprüfung

Für diese Konfiguration ist derzeit kein Überprüfungsverfahren verfügbar.

Fehlerbehebung

Was ist die SSD 2.5.1-Funktion für die einmalige Anmeldung?

Diese Funktion gilt für einen SSD-Server. Wenn der SSD-Server in seiner Cache-Datenbank kein Hostobjekt für einen Remoteclient finden kann, der HTTP-Datenverkehr sendet, sendet er eine Zugriffsanfrage an das SSG. Wenn die SSG über ein Hostobjekt verfügt, sendet sie eine Zugriffsannahmemeldung an die SSD. Der Benutzer kann dann den Zugriff auf die Services gewähren.

Wenn auf der SSD oder der SSG kein Hostobjekt vorhanden ist, sollte sich der Benutzer auf der SSD mit normalen SSD-Anmeldeauthentifizierungsverfahren authentifizieren.

Was muss ich vor der Konfiguration von SSG und SSD wissen?

Bevor Sie SSD oder SSG konfigurieren, müssen Sie Folgendes überprüfen:

- SSD, SSG und Authentication, Authorization, and Accounting (AAA) werden ausgeführt, und alle Netzwerkeinheiten können Ping-Signale senden.

- Der Remote-Benutzer kann jeden Host im Standardnetzwerk (SSG, SSD, AAA) pingen, bevor er sich beim SSD-Server anmeldet.

- Der Netzwerkzugangsanbieter (NAP), in diesem Fall der Cisco 6400 NRP1, kann einen Ping an das Ziel-Netzwerk senden.

- Der Remote-Client kann keinen Ping an das Zielnetzwerk für den Remote-Dienst senden.

Was kann ich tun, nachdem die PPPoA-Sitzung initiiert wurde, aber bevor eine SSD-Anmeldung eingerichtet wurde?

Nachdem alle SSG-Befehle konfiguriert wurden, müssen Sie überprüfen, ob die nächste Hop-Tabelle für die Dienste des Benutzers erfolgreich heruntergeladen wurde. Geben Sie den Befehl show ssg binding ein.

arielle_nrp3# show ssg binding

cairo.com_key        -> 14.14.14.5 (NHT)

arielle_nrp3# show ssg next-hop

Next hop table loaded from profile nxthoptbl:

cairo.com_key        -> 14.14.14.5

End of next hop table.

Überprüfen Sie, ob alle Ihre Richtungsbindungen auf dem SSG aktiv sind.

arielle_nrp3# show ssg direction

Virtual-Template66: Downlink

!--- You can verify this by enabling debug ssg ctrl-events after the !--- remote user tries to initiate its PPPoA session to access the NRP.

Jun 18 02:13:12.791: SSG-CTL-EVN: Handling PPP logon for user hisham.

Jun 18 02:13:12.791: SSG-CTL-EVN: Locate/create SSG sub-block from/for Virtual-Access3.

Jun 18 02:13:12.791: SSG-CTL-EVN: Checking for old HostObject in the sub-block.

Jun 18 02:13:12.791: SSG-CTL-EVN:  SSG: pppterm: NO extra data for PPP logon

Jun 18 02:13:12.791: SSG-CTL-EVN: Authenticating user hisham for PPP logon.

Jun 18 02:13:12.799: SSG-CTL-EVN: Creating HostObject for the PPP user hisham.

Jun 18 02:13:12.799: SSG-CTL-EVN: Set Host Mac Address .

Jun 18 02:13:12.799: SSG-CTL-EVN: ** attr->type = 6

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 1

Jun 18 02:13:12.799: SSG-CTL-EVN: ** attr->type = 7

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 2

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 3

Jun 18 02:13:12.799: SSG-CTL-EVN: ATTR_LOOP = 4

Jun 18 02:13:12.799: SSG-CTL-EVN: PPP logon for user hisham is accepted.

The link is Virtual-Access3

Jun 18 02:13:12.799: SSG-CTL-EVN: Bind the HostObject to Virtual-Access3.

!--- Downlink binding success.

Jun 18 02:13:12.867: SSG-CTL-EVN: IPCP is up. Locate SSG sub-block from Virtual-Access3.

Jun 18 02:13:12.871: SSG-CTL-EVN: Locate HostObject from the sub-block.

Jun 18 02:13:12.871: SSG-CTL-EVN: Set Host IP 212.93.193.114.

!--- Host object is created.

Jun 18 02:13:12.879: SSG-CTL-EVN: Host Mac Address lookup failed

Jun 18 02:13:12.879: SSG-CTL-EVN: Activate the HostObject.

Link=Virtual-Access3

!--- Host object is active.

Jun 18 02:13:12.879: SSG-CTL-EVN: ##### ssg_l2tp_ip_up:

03:49:01: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access3,

changed state to up

Wenn ein Client eine HTTP-Sitzung mit dem SSD-Server initiiert, wird die Startseite der SSD-Serveranmeldung angezeigt.

Hinweis: Denken Sie daran, den SSD-Serverbetrieb mit dem UNIX-Shell-Befehl root@crazyball[/export/home/ssd251/ssd]startSSD.sh zu starten.

Wie kann ich die SSD-Funktion zur einmaligen Anmeldung testen?

1. Konfigurieren Sie den Parameter (REAUTHENTICATE=off) in der Datei dashboard.conf. Der Standardwert ist REAUTHENTICATE=on.

2. Melden Sie sich bei einer beliebigen Webseite auf der SSD an. Wenn Sie beispielsweise bei der Startseite des Service cairo.com angemeldet sind, schließen Sie den Browser, und öffnen Sie ihn dann erneut unter http://10.200.56.40:8080.

Das Hostobjekt auf der SSD befindet sich noch im Cache. Sie sollten sich daher erneut bei der zuvor angemeldeten SSD-Dienstseite anmelden können. Das Standardverhalten ist die erneute Authentifizierung auf der SSD. Sie müssen also zur Startseite der SSD-Anmeldung gelangen.

Wie führe ich SSD-Debuggen aus?

1. Geben Sie https://10.200.56.40:8443/log in die Adressleiste des Browsers ein.

2. Klicken Sie auf Option festlegen. Alle von Ihnen ausgewählten Debugger werden ausgeführt, und die Ausgabe wird in einer Protokolldatei protokolliert. Das Format für den Protokolldateinamen ist yy_mm_dd.request.log.

3. Navigieren Sie zum Verzeichnis auf dem SSD-Server, in dem sich die Protokolldateien befinden.

4. Öffnen Sie mithilfe eines UNIX-Editors die Datei /export/home/ssd251/ssd/logs]vi yy_mm_dd.request.log, um die Debugausgabe anzuzeigen.

Beispielausgabe für Debugging

NRP1-Ausgang

arielle_nrp3# show debugging

SSG:

SSG data path packets debugging is on

SSG control path events debugging is on

SSG control path packets debugging is on

SSG packets debugging is on

Radius protocol debugging is on

Just before the SSD logon, the output of these debugs are :

Jun 18 23:30:08.414:

SSG-DATA:CEF-SSGSubBlock=0(AT0/0/0.61:0.0.0.0->0.0.0.0)

Jun 18 23:30:09.530:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 18 23:30:11.142:

SSG-DATA:CEF-SSGSubBlock=0(AT0/0/0.61:0.0.0.0->0.0.0.0)

Jun 18 23:30:11.494:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 18 23:30:12.482:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 18 23:30:13.310:

SSG-DATA:CEF-SSGSubBlock=0(AT0/0/0.61:0.0.0.0->0.0.0.0)

Jun 18 23:30:14.462:

Jun 18 23:39:39.610: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.638:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.638:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.642: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.642:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.646: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.674:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.678:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.678: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.682:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.686:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 18 23:39:39.686: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.698: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.742: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 18 23:39:39.926: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 00:39:17.477: RADIUS: Initial Transmit  id 18 10.200.56.16:1645,

Access-Request, len 58

Jun 19 00:39:17.477:         Attribute 4 6 D45DC301

Jun 19 00:39:17.477:         Attribute 61 6 00000000

Jun 19 00:39:17.477:         Attribute 1 8 68697368

Jun 19 00:39:17.477:         Attribute 2 18 31B0CDC2

Jun 19 00:39:17.481: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 00:39:17.481: RADIUS: Received from id 18 10.200.56.16:1645,

Access-Accept, len 70

Jun 19 00:39:17.481:         Attribute 6 6 00000002

Jun 19 00:39:17.481:         Attribute 7 6 00000001

Jun 19 00:39:17.481:         Attribute 26 20 00000009FA0E4754

Jun 19 00:39:17.481:         Attribute 26 18 00000009FA0C4742

Jun 19 00:39:17.481: RADIUS: saved authorization data for user 61E73934 at

61E72A58

Jun 19 00:39:17.481: SSG-CTL-EVN: Creating HostObject for host

212.93.193.114.

Jun 19 00:39:17.489: SSG-CTL-EVN: Set Host Mac Address .

Jun 19 00:39:17.489: SSG-CTL-EVN: ** attr->type = 6

Jun 19 00:39:17.489: SSG-CTL-EVN: ATTR_LOOP = 1

Jun 19 00:39:17.489: SSG-CTL-EVN: ** attr->type = 7

Jun 19 00:39:17.493: SSG-CTL-EVN: ATTR_LOOP = 2

Jun 19 00:39:17.493: SSG-CTL-EVN: ATTR_LOOP = 3

Jun 19 00:39:17.493: SSG-CTL-EVN: ATTR_LOOP = 4

Jun 19 00:39:17.493: SSG-CTL-EVN: Account logon is accepted

(212.93.193.114,hisham).

arielle_nrp3# show ssg host 212.93.193.114

------------------------ HostObject Content -----------------------

Activated: TRUE

Interface: Virtual-Access3

User Name: hisham

Host IP: 212.93.193.114

Msg IP: 10.200.56.40 (9902)

Host DNS IP: 0.0.0.0

Maximum Session Timeout: 0 seconds

Host Idle Timeout: 0 seconds

Class Attr: NONE

User logged on since: 01:54:33.000 UTC Tue Jun 19 2001

User last activity at: 01:54:33.000 UTC Tue Jun 19 2001

Default Service: NONE

DNS Default Service: NONE

Active Services: NONE

!--- No Services are active yet.

AutoService: NONE

Subscribed Services:

The following output also results from the debug commands that are turned on before the SSD logon.

Jun 19 02:06:39.529:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:06:40.789:

SSG-DATA:CEF-MulticastDest=1(AT0/0/0.61:14.14.14.5->224.0.0.10)

Jun 19 02:06:41.581:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:06:42.509:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:06:43.313:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:06:43.313: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:06:43.349:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:06:43.353:

arielle_nrp3# show ssg host 212.93.193.114

------------------------ HostObject Content -----------------------

Activated: TRUE

Interface: Virtual-Access3

User Name: hisham

Host IP: 212.93.193.114

Msg IP: 10.200.56.40 (9902)

!--- Message server IP & port adddress, and TCP port used. !--- This is configured in the dashboard.conf file.

Host DNS IP: 0.0.0.0

Maximum Session Timeout: 0 seconds

Host Idle Timeout: 0 seconds

Class Attr: NONE

User logged on since: 01:54:33.000 UTC Tue Jun 19 2001

User last activity at: 01:54:33.000 UTC Tue Jun 19 2001

Default Service: NONE

DNS Default Service: NONE

Active Services: NONE

AutoService: NONE

Subscribed Services:

arielle_nrp3#

An diesem Punkt hat sich der Benutzer bei keinem Dienst angemeldet. Der Kunde sieht zunächst den Nahen Osten, Kairo und dann Ägyptische Hauptstadt in der Dienstliste auf der SSD-Webseite. Wenn der Kunde auf Ägyptische Hauptstadt klickt, werden die Felder Benutzername und Kennwort auf der Seite angezeigt. Dem Client wurde noch kein aktiver Service zugeordnet. Der Benutzername und das Kennwort, die der Client für den Zugriff auf den Dienst cairo.com bereitstellt, müssen mit denen übereinstimmen, die vom L2TP-Netzwerkserver (LNS) konfiguriert wurden. In dieser Konfiguration authentifiziert das LNS die Benutzer lokal. Der Benutzername lautet ayman@cairo.com, und das Kennwort lautet ayman.

L2TP Access Concentrator (LAC)-Ausgabe

arielle_nrp3# show debugging

SSG:

SSG data path packets debugging is on

SSG control path events debugging is on

SSG control path packets debugging is on

SSG packets debugging is on

VPN:

L2X protocol events debugging is on

L2X data packets debugging is on

L2X control packets debugging is on

L2TP data sequencing debugging is on

Radius protocol debugging is on

Jun 19 02:34:48.121:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:34:48.157:

SSG-DATA:CEF-FIB_FLAG_RECEIVE=1(Vi3:212.93.193.114->10.200.56.6)

Jun 19 02:34:49.681:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:34:49.685: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.717:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:34:49.725:

SSG-DATA:CEF-UP-DefaultNetwork=1(Vi3:212.93.193.114->10.200.56.40)

Jun 19 02:34:49.725: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.777: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.777: SSG-CTL-PAK: Received Packet:

sIP=10.200.56.40 sPort=37638 dIP=10.200.56.6 dPort=1645

Jun 19 02:34:49.777:    header: code=1, id=19, len=102,

auth=3F53BB3F2939DAA1E5D9435792491CD3

Jun 19 02:34:49.777:    attr: type=1, len=17, val=ayman@cairo.com

Jun 19 02:34:49.777:    attr: type=2, len=18, val=(89)(C4)/}(BB)(8F)

Jun 19 02:34:49.777:    attr: type=6, len=6, val=(00)(00)(00)(02)

Jun 19 02:34:49.777:    attr: type=26, len=23,

Jun 19 02:34:49.777: SSG-CTL-EVN: Downloading service profile for service

cairo.com.

Jun 19 02:34:49.777: RADIUS: ustruct sharecount=1

Jun 19 02:34:49.777: RADIUS: Initial Transmit  id 73 10.200.56.16:1645,

Access-Request, len 67

Jun 19 02:34:49.777:         Attribute 4 6 D45DC301

Jun 19 02:34:49.777:         Attribute 61 6 00000000

Jun 19 02:34:49.777:         Attribute 1 11 63616972

Jun 19 02:34:49.777:         Attribute 2 18 51CF64B7

Jun 19 02:34:49.777:         Attribute 6 6 00000005

Jun 19 02:34:49.785: SSG-DATA:CEF-SSGSubBlock=0(Fa0/0/0:0.0.0.0->0.0.0.0)

Jun 19 02:34:49.785: RADIUS: Received from id 73 10.200.56.16:1645,

Access-Accept, len 275

Jun 19 02:34:49.785:         Attribute 6 6 00000005

Jun 19 02:34:49.785:         Attribute 26 27 0000000901157670

Jun 19 02:34:49.785:         Attribute 26 40 0000000901227670

Jun 19 02:34:49.785:         Attribute 26 30 0000000901187670

Jun 19 02:34:49.785:         Attribute 26 37 00000009011F7670

Jun 19 02:34:49.789: SSG-CTL-EVN: ##### ssg_l2tp_disc_cause: termCause=1026

Jun 19 02:34:49.789: SSG-CTL-EVN: ssg_l2tp_disc_routine:

Jun 19 02:34:49.801: SSG-CTL-EVN: Checking service mode.

Jun 19 02:34:49.801: SSG-CTL-EVN: ServiceLogon: Enqueue request of service

cairo.com

arielle_nrp3# show ssg host 212.93.193.114

------------------------ HostObject Content -----------------------

Activated: TRUE

Interface: Virtual-Access3

User Name: hisham

Host IP: 212.93.193.114

Msg IP: 10.200.56.40 (9902)

Host DNS IP: 0.0.0.0

Maximum Session Timeout: 0 seconds

Host Idle Timeout: 0 seconds

Class Attr: NONE

User logged on since: 01:54:33.000 UTC Tue Jun 19 2001

User last activity at: 02:34:49.000 UTC Tue Jun 19 2001

Default Service: NONE

DNS Default Service: NONE

Active Services: cairo.com

!--- A service is active.

AutoService: NONE

Subscribed Services:

arielle_nrp3# show ssg service cairo.com

------------------------ ServiceInfo Content -----------------------

Uplink IDB:

Name: cairo.com

Type: TUNNEL

Mode: CONCURRENT

Service Session Timeout: 0 seconds

Service Idle Timeout: 0 seconds

Authentication Type: CHAP

Next Hop Gateway Key: cairo.com_key

DNS Server(s):

TunnelId: nap

TunnelPassword: CAIRO

HomeGateway Addresses: 15.15.15.5

Included Network Segments:

15.15.15.4/255.255.255.252

Excluded Network Segments:

ConnectionCount 1

Full User Name not used

Domain List: cairo.com;

Active Connections:

1   : RealIP=212.93.197.114, Subscriber=212.93.193.114

------------------------ End of ServiceInfo Content ----------------

In der oben stehenden Ausgabe ist RealIP die IP-Adresse, die das Dienstnetzwerk dem Benutzer hisham zuweist. Das Teilnehmerfeld zeigt den IP-Adressbenutzer, der vom SSG-NRP-Zugangsnetzwerk zugewiesen wurde.

arielle_nrp3# show ssg connection 212.93.193.114 cairo.com

------------------------ ConnectionObject Content -----------------------

User Name: ayman@cairo.com Owner

Host: 212.93.193.114 Associated Service: cairo.com Connection State: 0 (UP) Connection

Started since: 02:34:51.000 UTC Tue Jun 19 2001 User last activity at: 02:34:51.000

UTC Tue Jun 19 2001 Connection Real IP: 212.93.197.114 L2TP VIDB: Virtual-Access4

L2TP Session Key: 0 Connection Traffic Statistics: Input Bytes = 0 (HI = 0), Input

packets = 0 Output Bytes = 0 (HI = 0), Output packets = 0

LNS-Ausgabe

ior# show debugging VPN

L2X protocol events debugging is on

L2X data packets debugging is on

L2X control packets debugging is on

L2TP data sequencing debugging is on

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 0, len 8, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Parse SCCRQ

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 2, len 8, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Protocol Ver 256

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 3, len 10, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Framing Cap 0x0

*Jun 18 19:27:09.851 PDT: L2X: Parse  AVP 4, len 10, flag 0x8000 (M)

*Jun 18 19:27:09.851 PDT: L2X: Bearer Cap 0x0

*Jun 18 19:27:09.855 PDT: L2X: Parse  AVP 6, len 8, flag 0x0

*Jun 18 19:27:09.855 PDT: L2X: I SCCRQ, flg TLS, ver 2, len 128, tnl 0, cl 0, ns 0, nr 0

C8 02 00 80 00 00 00 00 00 00 00 00 80 08 00 00

00 00 00 01 80 08 00 00 00 02 01 00 80 0A 00 00

00 03 00 00 00 00 80 0A 00 00 00 04 00 00 00 ...

*Jun 18 19:27:09.855 PDT: L2TP: I SCCRQ from nap tnl 13552

*Jun 18 19:27:09.855 PDT: Tnl 4818 L2TP: Got a challenge in SCCRQ, nap

*Jun 18 19:27:09.855 PDT: Tnl 4818 L2TP: New tunnel created for remote nap,

Zugehörige Informationen

- Unterstützung der Cisco DSL-Technologie

- Technischer Support und Dokumentation für Cisco Systeme