Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Konventionen

Hauptschnittstelle

Multipoint-Subschnittstelle

Point-to-Point-Subschnittstelle

Zugehörige Informationen

Einführung

In diesem Dokument wird die Notwendigkeit veranschaulicht, eine Virtual Path Identifier (VPI) und eine Virtual Channel Identifier (VCI) auf einer lokalen ATM-Schnittstelle zu konfigurieren, um einen Ping erfolgreich zu senden.

Durch die Anwendung einer IP-Adresse auf eine ATM-Schnittstelle wird die Schnittstelle einfach als geroutete IP-Schnittstelle konfiguriert. Konfigurieren Sie für Pings auch einen permanenten Virtual Circuit (PVC), sodass der Router weiß, über welchen virtuellen Circuit (VC) die ATM-Zellen gesendet werden sollen. Ohne VC meldet der Router einen Kapselungsfehler, wenn Debug-Befehle aktiviert sind. Durch Kapselung bezieht sich der Router auf den Layer-2-Header (L2), der das Ping-Paket umschließt.

Wenn Sie einen Ping an eine lokale Schnittstelle senden, werden die ATM-Zellen tatsächlich über das physische Kabel gesendet. Wenn die End-to-End-Leitung aktiv ist, werden die Ping-Zellen zum Remote-Routerende geleitet und anschließend erneut schleifen. Alternativ können Sie ein Hardware- oder Software-Loopback irgendwo entlang des Pfads konfigurieren, auch an der lokalen Schnittstelle selbst. Verwenden Sie den Loopback-Diagnosebefehl, um ein Software-Loopback zu konfigurieren.

Da ATM-VCs Point-to-Point sind, sollten Sie die folgenden Punkte über die Art der Schnittstelle berücksichtigen, auf der Sie VCs konfigurieren:

- Main Interface (Hauptschnittstelle) - Unterstützt mehrere VCs. Jeder VC muss entweder eine statische oder eine dynamische Zuordnung vornehmen, die den lokalen PVC-Werten zur Remote-IP-Adresse entspricht. Ohne Zuordnung meldet der Router eine Fehlermeldung für die Kapselung fehlgeschlagen, wenn Debug aktiviert ist.

- Multipoint-Subschnittstelle - Unterstützt mehrere VCs. Jeder VC muss entweder eine statische oder eine dynamische Zuordnung vornehmen, die den lokalen PVC-Werten zur Remote-IP-Adresse entspricht. Ohne Zuordnung meldet der Router eine Fehlermeldung für die Kapselung fehlgeschlagen, wenn Debug aktiviert ist.

- Point-to-Point-Subschnittstelle - Unterstützt eine einzelne VC. Da der Router per Definition davon ausgeht, dass am anderen Ende des VC ein einzelnes Gerät vorhanden ist, ist keine explizite Zuordnung erforderlich. Stattdessen leitet der Router Pakete basierend auf einer Routing-Entscheidung an den VC weiter. Anders ausgedrückt: Die Routing-Tabelle teilt dem Router mit, dass der nächste Hop für das IP-Paket das Remote-Ende des VC ist.

Voraussetzungen

Anforderungen

Für dieses Dokument bestehen keine speziellen Anforderungen.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions.

Hauptschnittstelle

Die folgende Tabelle zeigt die erforderlichen Konfigurationsbefehle für das Pingen der lokalen Schnittstelle, je nachdem, ob es sich um Point-to-Point- oder Multipoint-Verbindungen handelt.

Konfigurieren Sie nur eine IP-Adresse und kein VPI/VCI auf der Hauptleitungs-ATM-Schnittstelle.

!

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

!

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Router reports encapsulation failure messages because there is no VPI/VCI !--- on which to send the packet.

Konfigurieren einer PVC-Struktur auf der ATM-Hauptschnittstelle

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

encapsulation aal5snap

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

4/0            4              1    32   PVC    SNAP     149760                UP

cs-7204-15a#show atm map

cs-7204-15a#

debug ip packet

IP packet debugging is on

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Although this configures a PVC, either a dynamic or !--- static mapping is still needed between the L2 and Layer 3 (L3) addresses.

Konfigurieren einer statischen Map-Anweisung auf dem PVC

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map back to the local interface. !--- Normally, the map statement points to the remote IP address.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

!--- The router now sends the packets. However, since there is not a !--- remote end in the lab setup, the pings fail.

Konfigurieren der Loopback-Diagnose auf der Hauptschnittstelle

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

loopback diagnostic

!--- This configures a software loopback with the loopback diag command.

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

!--- The pings are successful. Note that the local interface both !--- receives its own Internet Control Message Protocol (ICMP) echo and echo-reply.

Multipoint-Subschnittstelle

Konfigurieren einer ATM-Multipoint-Schnittstelle

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

no atm ilmi-keepalive

!

interface ATM4/0.1 multipoint

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map or use inverse Address Resolution Protocol (ARP) on a multipoint subinterface.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0.1pvc5 : PERMANENT

ip 10.1.1.1 maps to VC 5, VPI 1, VCI 32, ATM4/0.1

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

Point-to-Point-Subschnittstelle

Point-to-Point-Subschnittstelle

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

!--- Use the loopback diagnostic command if !--- the PVC is not configured end to end.

no atm ilmi-keepalive

!

interface ATM4/0.2 point-to-point

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

encapsulation aal5snap

!--- Point-to-point interfaces do not need a static mapping or inverse ARP.

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

Zugehörige Informationen

- Mehrere Routingprotokolle über ATM-PVCs mit LLC-Kapselung

- Mehrere geroutete Protokolle über ATM-PVCs mit VC Multiplexing

- Grundlegende PVC-Konfiguration mit Bridge RFC 1483

- Bridge-PVC-Verbindung zwischen einem Router und einem Catalyst-Switch

- ATM (Asynchroner Übertragungsmodus) Technischer Support

- Weitere ATM-Informationen

- Technischer Support - Cisco Systems