Inhalt

Einführung

Bevor Sie beginnen

Konventionen

Voraussetzungen

Verwendete Komponenten

BPDU-Formate

Zugehörige Informationen

Einführung

Dieses Dokument beschreibt die Formate DEC und IEEE 802.1d Bridge Protocol Data Unit (BPDU).

Bevor Sie beginnen

Konventionen

Weitere Informationen zu Dokumentkonventionen finden Sie in den Cisco Technical Tips Conventions.

Voraussetzungen

Für dieses Dokument bestehen keine besonderen Voraussetzungen.

Verwendete Komponenten

Dieses Dokument ist nicht auf bestimmte Software- und Hardwareversionen beschränkt.

BPDU-Formate

Eine DEC BPDU hat folgendes Format:

DEC code:     E1

bpdu type:    19 hello, 02 topology change notice

version:      01

bit field:    1 byte

1 : topology change notice

2 : topology change notice ack

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : use short timers

root priority:   2 bytes

root id:         6 bytes

root path cost:  2 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         1 byte

message age:     1 byte

hello time:      1 byte

max age:         1 byte

forward delay:   1 byte

Ein IEEE 802.1d-BPDU hat folgendes Format:

protocol id:   0000 IEEE 802.1d

version id:    00

bpdu type:     00 config bpdu, 80 tcn bpdu

bit field:     1 byte

1 : topology change flag

2 : unused    0

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : topology change ack

root priority    2 bytes

root id:         6 bytes

root path cost:  4 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         2 bytes

message age:     2 bytes in 1/256 secs

max age:         2 bytes in 1/256 secs

hello time:      2 bytes in 1/256 secs

forward delay:   2 bytes in 1/256 secs

Zugehörige Informationen

- Technischer Support - Cisco Systems