المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

المشكلة

الحل

إعادة ضبط المصنع

إسترداد ESM باستخدام صورة برنامج فاسدة

إسترداد كلمة المرور

المقدمة

يوضح هذا المستند كيفية تنفيذ إعادة ضبط المصنع أو إسترداد كلمة المرور للوحدة النمطية لمحول الإيثرنت (ESM) على موجه الشبكة المتصلة 2010 من Cisco (CGR 2010). كما يمكن إستخدام هذا الإجراء لاستعادة وحدة ESM نمطية باستخدام صورة برنامج تالفة.

تمت المساهمة من قبل سوميدا فاتاك ودوي نجوين، مهندسي TAC من Cisco.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

- ESM ل CiSCO2000

- CGR 2010

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك مباشرة، فتأكد من فهمك للتأثير المحتمل لأي أمر.

المشكلة

لتنفيذ إعادة ضبط المصنع، إسترداد كلمة المرور للوحدة النمطية ESM أو إسترداد وحدة نمطية ESM باستخدام صورة برنامج فاسدة على CGR 2010.

ملاحظة: يلزم وجود اتصال مباشر بالمحول CGR 2010 عبر وحدة التحكم حتى يعمل هذا الإجراء.

الحل

الخطوة 1. يمكنك الاتصال بالمحول CGR 2010 مباشرة من خلال وحدة التحكم.

الخطوة 2. قم بإصدار الأمر service-module gix/x/x reload لإعادة تحميل ESM:

service-module gi0/0/0 reload

الخطوة 3. عند تمهيد وحدة ESM، أستخدم سنا للضغط على زر "الإعداد السريع (ES)" الموجود على الوحدة النمطية ESM لكسر تسلسل التمهيد.

الخطوة 4. أدخل ESM بإصدار جلسة عمل service-module gix/x/x.

الخطوة 5. ما إن في المفتاح: رسالة حث، يهيئ برق: ب يصدر flash_init. بعد الخطوة 5.، اتبع الأقسام المناسبة.

إعادة ضبط المصنع

الخطوة 6. احذف ملف config.text وvlan.dat.

switch: delete flash:config.text

switch: delete flash:vlan.dat

الخطوة 7. قم بتحميل صورة النظام وأصدر الأمر boot flash:<image-name>.

إسترداد ESM باستخدام صورة برنامج فاسدة

الخطوة 8. يمكن نسخ صورة جديدة إلى ESM باستخدام مودم x. من محول ESM: اضغط على مفتاح الإدخال Enter عدة مرات لمسح الخط.

الخطوة 9. اضغط على Control + Shift + 6 + X للعودة إلى المحول CGR 2010. قم بمسح جلسة عمل ESM لنقلها إلى xmodem بنجاح.

service-module gigabitEthernet 0/0/0 session clear

الخطوة 10. مرة في CGR، أستخدم أمر copy flash:<file from CGR2010> xmodem: لنسخ صورة ESM الجديدة إلى xmodem.

cgr2010-ast03-lab#copy flash:test1 xmodem:test2

**** WARNING ****

x/ymodem is a slow transfer protocol limited to the current speed

settings of the auxiliary/console ports. The use of the auxiliary

port for this download is strongly recommended.

During the course of the download no exec input/output will be

available.

---- ******* ----

Proceed? [confirm]

Destination filename [test2]?

Service Module slot number? [1]: 0

Service Module interface number? [0]:

1k buffer? [confirm]

Max Retry Count [10]: 2

Xmodem send on slot 0 interface 0. Please be sure there is enough space on receiving side.

Continue? [confirm]

Ready to send file...........C!!!

3072 bytes copied in 24.596 secs (125 bytes/sec)

الخطوة 11. بعد نسخ صورة ESM إلى xmodem: بنجاح، سجل الدخول إلى وحدة ESM النمطية.

service-module gigabitEthernet 0/0/0 session

الخطوة 12. في المحول: قم باستخدام الأمر boot على ESM: قم بتحميل الصورة المناسبة.

switch: boot flash:grwicdes-ipservicesk9-mz.152-5.E1.bin

Loading flash:grwicdes-ipservicesk9-mz.152-5.E1.bin...######################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

#######################################################################################################################

File flash:grwicdes-ipservicesk9-mz.152-5.E1.bin uncompressed and installed, entry point: 0x1000000

executing...

إسترداد كلمة المرور

الخطوة 13. أصدرت dir flash: أمر.

Switch#dir flash:

Directory of flash:/

2 -rwx 3401 Jan 1 1970 00:08:20 +00:00 config.text.back

3 -rwx 24872960 Jan 1 1970 00:57:43 +00:00 grwicdes-ipservicesk9-mz.152-5.E1.bin

4 -rwx 3423 Jan 1 1970 00:27:29 +00:00 config.text.backup

الخطوة 14. اكتب reset:flash:config.text flash:config.old لإعادة تسمية ملف التكوين.

switch: rename flash:config.text flash:config.old

الخطوة 15. قم بإصدار الأمر boot.

switch: boot

Loading flash:/grwicdes-ipservicesk9-mz.152-5.E1.bin...#####################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

############################################################################################################################################################################

#############################################################################################################

File flash:/grwicdes-ipservicesk9-mz.152-5.E1.bin uncompressed and installed, entry point: 0x1000000

executing...

الخطوة 16. أدخل n عند المطالبة بإجهاض مربع حوار التكوين الأولي.

Enable secret warning

----------------------------------

In order to access the device manager, an enable secret is required

If you enter the initial configuration dialog, you will be prompted for the enable secret

If you choose not to enter the intial configuration dialog, or if you exit setup without setting the enable secret,

please set an enable secret using the following CLI in configuration mode-

enable secret 0 <cleartext password>

----------------------------------

Would you like to enter the initial configuration dialog? [yes/no]: no

Copyright (c) 1986-2016 by Cisco Systems, Inc.

Compiled Wed 23-Nov-16 02:30 by prod_rel_team

*Mar 1 00:01:23.718: %SYS-5-CONFIG_I: Configured from console by console

الخطوة 17. في نافذة مطالبة المحول، اكتب en لإدخال وضع التمكين.

Switch>en

Switch#

الخطوة 18.

اكتب reset:flash:config.old flash:config.text لإعادة تسمية ملف التكوين باسمه الأصلي.

Switch#rename flash:config.old flash:config.text

الخطوة 19. انسخ ملف التكوين في الذاكرة.

Switch#copy flash:config.text running-config

الخطوة 20. الكتابة فوق كلمات المرور الحالية.

الخطوة 21. انسخ التكوين الحالي باستخدام كلمات المرور الجديدة إلى startup-config.

switch_austin#copy running-config startup-config

Destination filename [startup-config]?

Building configuration...

[OK]