المحتويات

المقدمة

كيف يمكنني إستخدام بروتوكول SNMP لإعادة تحميل محول؟

معلومات ذات صلة

المقدمة

يقدم هذا المستند إجابات عن الأسئلة الشائعة، ويرشد المستخدمين للعثور على موارد مفيدة حول مشاكل SNMP و SNMP فيما يتعلق بمعدات Cisco.

س. كيف يمكنني إستخدام بروتوكول SNMP لإعادة تحميل محول؟

أ. اتبع هذا الإجراء:

sysReset = .1.3.6.1.4.1.9.2.9.9 from the CISCO-STACK-MIB.my sysReset OBJECT-TYPE

-- FROM CISCO-STACK-MIB

SYNTAX Integer { other(1), reset(2), resetMinDown(3) }

MAX-ACCESS read-write

STATUS Current

DESCRIPTION "Writing reset(2) to this object resets the control logic of all modules in the system. Writing

resetMinDown(3) to this object resets the system with the minimal system down time. The resetMinDown(3) is

only supported in systems with redundant supervisors."

::= { iso(1) org(3) dod(6) internet(1) private(4) enterprises(1) cisco(9) workgroup(5) ciscoStackMIB(1) systemGrp(1) 9 }

على محول Cisco، يجب عليك تعيين الأمر set snmp community read-write private لدعم الأمر reload.

يعيد هذا المثال تحميل الموجه باستخدام عنوان IP 10.16.99.55:

# ./snmpset 10.16.99.55 private .1.3.6.1.4.1.9.2.9.9.0 i 2

هذا شرح للمتغيرات المستخدمة سابقا:

10.16.99.55 = ip address of your switch

private = R/W SNMP Community string of your switch .

1.3.6.1.4.1.9.2.9.9.0 = the instance of sysReset Object

i = Integer as defined SYNTAX in the MIB

2 = reload command as defined in the MIB

معلومات ذات صلة

- التلميحات التقنية لخدمات تطبيق IP

- الدعم الفني - Cisco Systems