المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

التكوين

الرسم التخطيطي للشبكة

التكوينات

التحقق من الصحة

استكشاف الأخطاء وإصلاحها

المقدمة

يصف هذا المستند كيفية تكوين تجدولة بروتوكول العبارة الحدودية (eBGP) والتحقق من صحته بين زوج еXUS من vPC وجهاز آخر. يتم عرض التكوين على الجهاز الخارجي على أنه Cisco CLI NX-OS للوضوح.

المتطلبات الأساسية

المتطلبات

توصي Cisco بأن تكون لديك معرفة بالمواضيع التالية:

- المفاهيم الأساسية الخاصة بالتشغيل والتكوين في الكمبيوتر. المرجع: https://www.cisco.com/c/dam/en/us/td/docs/switches/datacenter/sw/design/vpc_design/vpc_best_practices_design_guide.pdf

- تشغيل BGP وتكوينه

المكونات المستخدمة

تستند المعلومات الواردة في هذا المستند إلى إصدارات البرامج والمكونات المادية التالية:

page1#

المحول C93108TC-FX

NXOS 9.3(3)

page2#

المحول C93108TC-FX

NXOS 9.3(3)

جهاز خارجي

N9K-C9396PX

NXOS: الإصدار 9.2(3)

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

تجانس بروتوكولات التوجيه (OSPF و ISIS و RIP و EIGRP و BGP) بين زوج أجهزة الكمبيوتر الافتراضية وجهاز خارجي. وهذا مدعوم وفقا لما يلي: https://www.cisco.com/c/en/us/support/docs/ip/ip-routing/118997-technote-nexus-00.html. تصف هذه المقالة الملاحظات الإضافية وأمثلة التكوين ل eBGP كبروتوكول توجيه.

يتم عرض العديد من المشاكل عند محاولة تمكين إعادة توجيه بروتوكول التوجيه عبر PC، والتي لا توجد عند الاستخدام

قناة قياسية ذات منفذ:

1. ليس من المحدد أي عضو من قناة الميناء سيستخدمه الجهاز الخارجي لإعادة توجيه حركة مرور لكل عنوان MAC. من الممكن أن يرسل الجهاز الخارجي حزم BGP لورقة-1 عبر الارتباط إلى ورقة-1. عندما يستلمه Leaf-1، هو سيلكمه إلى وحدة المعالجة المركزية ويتجاهله (ليس له عنوان IP)، لذلك BGP (unicast) أو بروتوكول آخر (multicast) يكون يرفرف باستمرار. هنا يساعد الأمر peer-gateway.

2. وحتى مع أمر عبارة النظير، سيتم تقليل مدة البقاء (TTL) على حزمة من هذا القبيل. الأمر الجديد في NX-OS - layer3 يقوم موجه النظير بتعطيل ذلك.

3. يلزم وجود بروتوكول iBGP بين عضوين في بروتوكول vPC لإطاعة قاعدة بروتوكول بوابة الحدود (BGP) لبروتوكول iBGP بين جميع الجيران. يتم تشغيله داخل VRF على جانب vPC، وبالتالي يحتاج هذان العضوان فقط إلى تشغيل iBGP. يلزم أيضا في حالة حدوث فشل إرتباط لباقي شبكة NX-OS (الشبكة المحلية الظاهرية (VXlan) أو غيرها) وتوفير التكرار.

التكوين

الرسم التخطيطي للشبكة

هناك حاجة إلى أمرين مهمين لتمكين هذه النظرة:

- عبارة النظير - تتيح وظيفة عبارة النظير-PC vPC لمحول vPC العمل كبوابة نشطة للحزم التي يتم توجيهها إلى عنوان MAC للموجه الخاص بنظير vPC

- موجه النظير للطبقة 3 - لا يوجد تغيير ل TTL للحزم الموجهة إلى النظير، يرى الجهاز الخارجي المجال vPC ككيان مادي واحد من منظور تناظر بروتوكول توجيه الطبقة أيضا.

التكوينات

Leaf 1:

! Form the vPC domain:

vpc domain 1

peer-switch

role priority 10 peer-keepalive destination 192.0.2.2 source 192.0.2.1 peer-gateway layer3 peer-router ipv6 nd synchronize ip arp synchronize

!

!vPC peer-link interface members

interface Ethernet1/53 - 54

description vPC-Peerlink member

switchport

switchport mode trunk

channel-group 11 mode active

no shutdown

!

! vPC peer-link port-channel

interface port-channel11

description vPC-peerlink

switchport

switchport mode trunk

spanning-tree port type network

no shutdown

vpc peer-link

!

! vPC port-channel member to External Device

interface Ethernet1/52

description ExternalDevice Eth2/13

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

! vPC port-channel to External Device

interface port-channel12

description vPC port-channel to External Device

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

vpc 12

!

! Layer 3 interface to the Eternal device:

interface Vlan205

no shutdown

vrf member Customer

! BFD for eBGP

bfd interval 500 min_rx 500 multiplier 3

! Disable bfd echo, as it is not supported over vPC

no bfd echo

no ip redirects

! We use/29 as we need 3 ip address, one per each member of the ! vPC domain and 3rd for the External Device

ip address 198.51.100.1/29 tag 800204

! Disable redirects - this is needed to enable BFD

no ipv6 redirects

!

router bgp 65535

router bgp 65535

router-id 203.0.113.1

log-neighbor-changes

address-family ipv4 unicast

Customer router-id 198.51.100.1 address-family ipv4 unicast neighbor 198.51.100.2 description Leaf-2 remote-as 65535 address-family ipv4 unicast soft-reconfiguration inbound always neighbor 198.51.100.3 description to External Device bfd remote-as 65000 update-source Vlan205 address-family ipv4 unicast soft-reconfiguration inbound always ! Leaf 2:

! Form the vPC domain:

vpc domain 1

peer-switch

role priority 10

peer-keepalive destination 192.0.2.1 source 192.0.2.2

peer-gateway

layer3 peer-router

ipv6 nd synchronize

ip arp synchronize

!

!vPC peer-link interface members

interface Ethernet1/53 - 54

description vPC-Peerlink member

switchport

switchport mode trunk

channel-group 11 mode active

no shutdown

!

! vPC peer-link port-channel

interface port-channel11

description vPC-peerlink

switchport

switchport mode trunk

spanning-tree port type network

no shutdown

vpc peer-link

!

! vPC port-channel member to External Device

interface Ethernet1/52

description ExternalDevice Eth2/13

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

! vPC port-channel to External Device

interface port-channel12

description vPC port-channel to External Device

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

vpc 12

!

! Layer 3 interface to the Eternal device:

interface Vlan205

no shutdown

vrf member Customer

! BFD for eBGP

bfd interval 500 min_rx 500 multiplier 3

! Disable bfd echo, as it is not supported over vPC

no bfd echo

no ip redirects

! We use/29 as we need 3 ip address, one per each member of the ! vPC domain and 3rd for the External Device

ip address 198.51.100.2/29 tag 800204

! Disable redirects - this is needed to enable BFD

no ipv6 redirects

!

router bgp 65535

router bgp 65535

router-id 203.0.113.2

log-neighbor-changes

address-family ipv4 unicast

vrf Customer

router-id 198.51.100.2

address-family ipv4 unicast

neighbor 198.51.100.1

description Leaf-2

remote-as 65535

address-family ipv4 unicast

soft-reconfiguration inbound always

neighbor 198.51.100.3

description to External Device

bfd

remote-as 65000

update-source Vlan205

address-family ipv4 unicast

soft-reconfiguration inbound always

!

External Device (NX-OS style CLI):

interface Ethernet2/13 - 14

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

channel-group 12 mode active

no shutdown

!

interface port-channel12

switchport

switchport mode trunk

switchport trunk allowed vlan 203,205

mtu 9216

no shutdown

!

interface Vlan205

no shutdown

mtu 9216

! See notes in Leaf-1 and Leaf 2 for BFD

bfd interval 500 min_rx 500 multiplier 3

no bfd echo

no ip redirects

ip address 198.51.100.3/29

no ipv6 redirects

!

router bgp 65000

log-neighbor-changes

address-family ipv4 unicast

neighbor 198.51.100.1 remote-as 65535

description to Leaf-1

update-source Vlan205

bfd

neighbor 198.51.100.2 remote-as 65535

description to Leaf-2

update-source Vlan205

bfd

end

!

التحقق من الصحة

فيما يلي مخرج جيران البث الأحادي الخاصة ب show bgp ipV4. وهو يتحقق مما يلي:

1. منطقة الجوار في بريتيش بتروليوم مستقرة

2. تم تمكين BFD بين الجيران الخارجيين

Leaf 1/2: show bgp ipv4 unicast neighbors vrf Customer BGP neighbor is 203.0.113.2, remote AS 65535, ibgp link, Peer index 4 BGP version 4, remote router ID 203.0.113.2 Neighbor previous state = OpenConfirm BGP state = Established, up for 6d22h Neighbor vrf: Customer Peer is directly attached, interface Vlan205 Last read 00:00:14, hold time = 180, keepalive interval is 60 seconds Last written 00:00:03, keepalive timer expiry due 00:00:56 Received 10012 messages, 0 notifications, 0 bytes in queue ... BGP neighbor is 203.0.113.2.3, remote AS 65000, ebgp link, Peer index 3 BGP version 4, remote router ID 203.0.113.2 Neighbor previous state = OpenConfirm BGP state = Established, up for 1d00h Neighbor vrf: Customer Using Vlan205 as update source for this peer Peer is directly attached, interface Vlan205 BFD live-detection is configured and enabled, state is Up Last read 00:00:22, hold time = 180, keepalive interval is 60 seconds Last written 00:00:56, keepalive timer expiry due 00:00:03 ! External Device: show bgp ipv4 unicast neighbors BGP neighbor is 203.0.113.1, remote AS 65535, ebgp link, Peer index 3 Inherits peer configuration from peer-template Cust_BGP_Peer BGP version 4, remote router ID 203.0.113.1 BGP state = Established, up for 1d00h Peer is directly attached, interface Vlan205 Enable logging neighbor events BFD live-detection is configured and enabled, state is Up Last read 0.660288, hold time = 180, keepalive interval is 60 seconds Last written 00:00:26, keepalive timer expiry due 00:00:33 Received 10122 messages, 1 notifications, 0 bytes in queue Sent 10086 messages, 1 notifications, 0(0) bytes in queue Connections established 14, dropped 13 Last reset by us 1d00h, due to bfd session down Last reset by peer 6d22h, due to other configuration change ....

استكشاف الأخطاء وإصلاحها

ستساعد الأوامر التالية في التحقق من العملية:

show vpc show vpc consistency-parameters global show vpc consistency-parameters interface

show bgp ipv4 unicast neighbors show bgp ipv4 unicast summary