المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

الاصطلاحات

الواجهة الرئيسية

الواجهة الفرعية Multipoint

الواجهة الفرعية من نقطة إلى نقطة

معلومات ذات صلة

المقدمة

يوضح هذا المستند الحاجة إلى تكوين معرف المسار الظاهري (VPI) ومعرف القناة الظاهرية (VCI) على واجهة ATM المحلية من أجل إختبار الاتصال بنجاح.

يؤدي تطبيق عنوان IP على واجهة ATM ببساطة إلى تكوين الواجهة لكي تكون واجهة IP موجهة. لكي تعمل إختبارات الاتصال، قم أيضا بتكوين دائرة افتراضية دائمة (PVC)، لذلك يعرف الموجه من خلالها الدائرة الظاهرية (VC) لإرسال خلايا ATM. بدون VC، يقوم الموجه بالإعلام عن فشل عملية كبسلة إذا تم تمكين أوامر تصحيح الأخطاء. من خلال التضمين، يشير الموجه إلى رأس الطبقة 2 (L2) الذي يلتف حول حزمة إختبار الاتصال.

عند إختبار الاتصال بواجهة محلية، فإن خلايا ATM يتم إرسالها بالفعل على السلك المادي. إذا كانت الدائرة من نهاية إلى نهاية نشطة، تنتقل خلايا إختبار الاتصال إلى نهاية الموجه البعيد ثم يتم إجراء تكرار حلقي إلى الخلف. يمكنك بالتناوب تكوين إسترجاع أجهزة أو برامج في مكان ما على المسار، بما في ذلك على الواجهة المحلية نفسها. أستخدم الأمر loopback diagnostic لتكوين إسترجاع برنامج.

بما أن ATM VCs هي نقطة إلى نقطة، نظرت في النقاط التالية حول نوع الواجهة التي تقوم بتكوين VCs عليها:

- الواجهة الرئيسية—تدعم العديد من نقاط الوصول الظاهرية (VCs). يحتاج كل VC إلى إما تعيين ساكن إستاتيكي أو ديناميكي أن يطابق ال PVC قيمة محلي إلى العنوان بعيد. بدون تعيين، سيقوم الموجه بالإبلاغ عن رسالة خطأ فشلت عملية كبسلة مع تمكين تصحيح الأخطاء.

- واجهة Multipoint الفرعية—تدعم شبكات VC المتعددة. يحتاج كل VC إلى إما تعيين ساكن إستاتيكي أو ديناميكي أن يطابق ال PVC قيمة محلي إلى العنوان بعيد. بدون تعيين، سيقوم الموجه بالإبلاغ عن رسالة خطأ فشلت عملية كبسلة مع تمكين تصحيح الأخطاء.

- واجهة فرعية من نقطة إلى نقطة — تدعم معرف فئة مورد (VC) واحدا. بما أن الموجه يفترض بحكم التعريف أن هناك جهاز وحيد في الطرف الآخر من VC، ما من تعيين صريح مطلوب. بدلا من ذلك، يقوم الموجه بإعادة توجيه الحزم خارج VC بناء على قرار توجيه. بمعنى آخر، يخبر جدول التوجيه الموجه بأن الخطوة التالية لحزمة IP هي الطرف البعيد ل VC.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

لا يقتصر هذا المستند على إصدارات برامج ومكونات مادية معينة.

الاصطلاحات

للحصول على مزيد من المعلومات حول اصطلاحات المستندات، ارجع إلى اصطلاحات تلميحات Cisco التقنية.

الواجهة الرئيسية

توضح الجداول التالية أوامر التكوين الضرورية لربط الواجهة المحلية بناء على ما إذا كانت من نقطة إلى نقطة أو متعددة النقاط.

قم بتكوين عنوان IP فقط ولا يوجد VPI/VCI على واجهة ATM الرئيسية

!

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

!

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Router reports encapsulation failure messages because there is no VPI/VCI !--- on which to send the packet.

تكوين PVC على واجهة ATM الرئيسية

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

encapsulation aal5snap

cs-7204-15a#show atm vc

VCD /                                     Peak Avg/Min Burst

Interface      Name         VPI   VCI  Type   Encaps     Kbps   Kbps  Cells Sts

4/0            4              1    32   PVC    SNAP     149760                UP

cs-7204-15a#show atm map

cs-7204-15a#

debug ip packet

IP packet debugging is on

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

4w2d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, encapsulation failed

!--- Although this configures a PVC, either a dynamic or !--- static mapping is still needed between the L2 and Layer 3 (L3) addresses.

تكوين بيان خريطة ثابت على PVC

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map back to the local interface. !--- Normally, the map statement points to the remote IP address.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending.

!--- The router now sends the packets. However, since there is not a !--- remote end in the lab setup, the pings fail.

تكوين تشخيص الاسترجاع على الواجهة الرئيسية

interface ATM4/0

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

loopback diagnostic

!--- This configures a software loopback with the loopback diag command.

no atm ilmi-keepalive

pvc 1/32

protocol ip 10.1.1.1

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0pvc4 : PERMANENT

ip 10.1.1.1 maps to VC 4, VPI 1, VCI 32, ATM4/0

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0), d=10.1.1.1 (ATM4/0), len 100, rcvd 3

!--- The pings are successful. Note that the local interface both !--- receives its own Internet Control Message Protocol (ICMP) echo and echo-reply.

الواجهة الفرعية Multipoint

تكوين واجهة ATM متعددة النقاط

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

no atm ilmi-keepalive

!

interface ATM4/0.1 multipoint

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

protocol ip 10.1.1.1

!--- This configures a static map or use inverse Address Resolution Protocol (ARP) on a multipoint subinterface.

encapsulation aal5snap

cs-7204-15a#show atm map

Map list ATM4/0.1pvc5 : PERMANENT

ip 10.1.1.1 maps to VC 5, VPI 1, VCI 32, ATM4/0.1

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

5w1d: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.1), len 100, sending

5w1d: IP: s=10.1.1.1 (ATM4/0.1), d=10.1.1.1 (ATM4/0.1), len 100, rcvd 3

الواجهة الفرعية من نقطة إلى نقطة

الواجهة الفرعية من نقطة إلى نقطة

interface ATM4/0

no ip address

no ip directed-broadcast

loopback diagnostic

!--- Use the loopback diagnostic command if !--- the PVC is not configured end to end.

no atm ilmi-keepalive

!

interface ATM4/0.2 point-to-point

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

pvc 1/32

encapsulation aal5snap

!--- Point-to-point interfaces do not need a static mapping or inverse ARP.

cs-7204-15a#show atm map

cs-7204-15a#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/2/4 ms

cs-7204-15a#

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

00:11:03: IP: s=10.1.1.1 (local), d=10.1.1.1 (ATM4/0.2), len 100, sending

00:11:03: IP: s=10.1.1.1 (ATM4/0.2), d=10.1.1.1 (ATM4/0.2), len 100, rcvd 3

معلومات ذات صلة

- البروتوكولات المتعددة الموجهة عبر ATM PVCs باستخدام تضمين LLC

- البروتوكولات المتعددة الموجهة عبر ATM PVCs باستخدام تجميع VC

- تكوين PVC أساسي باستخدام RFC 1483 جسر

- اتصال PVC الجسر بين موجه ومحول Catalyst

- الدعم الفني ل ATM (وضع النقل غير المتزامن)

- المزيد من معلومات ATM

- الدعم الفني - Cisco Systems